\hypertarget{structLTC__HeatPipe}{
\section{LTC\_\-Heat\-Pipe Struct Reference}
\label{structLTC__HeatPipe}\index{LTC_HeatPipe@{LTC\_\-HeatPipe}}
}
All data associated with a heat pipe (VCHP).  


{\tt \#include $<$ltc\-Private.h$>$}

Collaboration diagram for LTC\_\-Heat\-Pipe:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=205pt]{structLTC__HeatPipe__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{structLTC__Sensor}{LTC\_\-Sensor} \hyperlink{structLTC__HeatPipe_o0}{snsr} \mbox{[}LTC\_\-SNSR\_\-TYPS\mbox{]}
\item 
\hyperlink{ltcPrivate_8h_a21}{LTC\_\-Cntrl\-Params} \hyperlink{structLTC__HeatPipe_o1}{param}
\item 
\hyperlink{structLTC__Options}{LTC\_\-Options} \hyperlink{structLTC__HeatPipe_o2}{opts}
\item 
\hyperlink{structLTC__Temperature}{LTC\_\-Temperature} \hyperlink{structLTC__HeatPipe_o3}{temp} \mbox{[}LTC\_\-TMP\_\-TYPS\mbox{]}
\end{CompactItemize}


\subsection{Detailed Description}
All data associated with a heat pipe (VCHP). 



\subsection{Field Documentation}
\hypertarget{structLTC__HeatPipe_o2}{
\index{LTC_HeatPipe@{LTC\_\-Heat\-Pipe}!opts@{opts}}
\index{opts@{opts}!LTC_HeatPipe@{LTC\_\-Heat\-Pipe}}
\subsubsection[opts]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__Options}{LTC\_\-Options} \hyperlink{structLTC__HeatPipe_o2}{LTC\_\-Heat\-Pipe::opts}}}
\label{structLTC__HeatPipe_o2}


Option selections \hypertarget{structLTC__HeatPipe_o1}{
\index{LTC_HeatPipe@{LTC\_\-Heat\-Pipe}!param@{param}}
\index{param@{param}!LTC_HeatPipe@{LTC\_\-Heat\-Pipe}}
\subsubsection[param]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{ltcPrivate_8h_a21}{LTC\_\-Cntrl\-Params} \hyperlink{structLTC__HeatPipe_o1}{LTC\_\-Heat\-Pipe::param}}}
\label{structLTC__HeatPipe_o1}


Control algorithm params per heat pipe \hypertarget{structLTC__HeatPipe_o0}{
\index{LTC_HeatPipe@{LTC\_\-Heat\-Pipe}!snsr@{snsr}}
\index{snsr@{snsr}!LTC_HeatPipe@{LTC\_\-Heat\-Pipe}}
\subsubsection[snsr]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__Sensor}{LTC\_\-Sensor} \hyperlink{structLTC__HeatPipe_o0}{LTC\_\-Heat\-Pipe::snsr}\mbox{[}LTC\_\-SNSR\_\-TYPS\mbox{]}}}
\label{structLTC__HeatPipe_o0}


Sensor raw values \& processing info \hypertarget{structLTC__HeatPipe_o3}{
\index{LTC_HeatPipe@{LTC\_\-Heat\-Pipe}!temp@{temp}}
\index{temp@{temp}!LTC_HeatPipe@{LTC\_\-Heat\-Pipe}}
\subsubsection[temp]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__Temperature}{LTC\_\-Temperature} \hyperlink{structLTC__HeatPipe_o3}{LTC\_\-Heat\-Pipe::temp}\mbox{[}LTC\_\-TMP\_\-TYPS\mbox{]}}}
\label{structLTC__HeatPipe_o3}


Temperature info 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
