\hypertarget{structLTC__Cntrl}{
\section{LTC\_\-Cntrl Struct Reference}
\label{structLTC__Cntrl}\index{LTC_Cntrl@{LTC\_\-Cntrl}}
}
Control algorithm heater \char`\"{}on/off\char`\"{} and history bit masks.  


{\tt \#include $<$ltc\-Private.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
unsigned short \hyperlink{structLTC__Cntrl_o0}{cmd}
\end{CompactItemize}


\subsection{Detailed Description}
Control algorithm heater \char`\"{}on/off\char`\"{} and history bit masks. 



\subsection{Field Documentation}
\hypertarget{structLTC__Cntrl_o0}{
\index{LTC_Cntrl@{LTC\_\-Cntrl}!cmd@{cmd}}
\index{cmd@{cmd}!LTC_Cntrl@{LTC\_\-Cntrl}}
\subsubsection[cmd]{\setlength{\rightskip}{0pt plus 5cm}unsigned short \hyperlink{structLTC__Cntrl_o0}{LTC\_\-Cntrl::cmd}}}
\label{structLTC__Cntrl_o0}


on/off command each heater 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
