\hypertarget{structLTC__HpConfigRec}{
\section{LTC\_\-Hp\-Config\-Rec Struct Reference}
\label{structLTC__HpConfigRec}\index{LTC_HpConfigRec@{LTC\_\-HpConfigRec}}
}
Configuration data for a single heat pipe.  


{\tt \#include $<$ltc\-Private.h$>$}

Collaboration diagram for LTC\_\-Hp\-Config\-Rec:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=72pt]{structLTC__HpConfigRec__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{structLTC__Options}{LTC\_\-Options} \hyperlink{structLTC__HpConfigRec_o0}{opts}
\item 
\hyperlink{ltcPrivate_8h_a19}{LTC\_\-Cntrl\-Params} \hyperlink{structLTC__HpConfigRec_o1}{param}
\end{CompactItemize}


\subsection{Detailed Description}
Configuration data for a single heat pipe. 



\subsection{Field Documentation}
\hypertarget{structLTC__HpConfigRec_o0}{
\index{LTC_HpConfigRec@{LTC\_\-Hp\-Config\-Rec}!opts@{opts}}
\index{opts@{opts}!LTC_HpConfigRec@{LTC\_\-Hp\-Config\-Rec}}
\subsubsection[opts]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__Options}{LTC\_\-Options} \hyperlink{structLTC__HpConfigRec_o0}{LTC\_\-Hp\-Config\-Rec::opts}}}
\label{structLTC__HpConfigRec_o0}


Option selections \hypertarget{structLTC__HpConfigRec_o1}{
\index{LTC_HpConfigRec@{LTC\_\-Hp\-Config\-Rec}!param@{param}}
\index{param@{param}!LTC_HpConfigRec@{LTC\_\-Hp\-Config\-Rec}}
\subsubsection[param]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{ltcPrivate_8h_a19}{LTC\_\-Cntrl\-Params} \hyperlink{structLTC__HpConfigRec_o1}{LTC\_\-Hp\-Config\-Rec::param}}}
\label{structLTC__HpConfigRec_o1}


Control algorithm params per heat pipe 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
