\hypertarget{structLTC__CntrlParams}{
\section{LTC\_\-Cntrl\-Params Struct Reference}
\label{structLTC__CntrlParams}\index{LTC_CntrlParams@{LTC\_\-CntrlParams}}
}
Control algogrithm parameters for a heat pipe.  


{\tt \#include $<$ltc\-Private.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
signed short \hyperlink{structLTC__CntrlParams_o0}{res\-Lo}
\item 
signed short \hyperlink{structLTC__CntrlParams_o1}{res\-Hi}
\item 
signed short \hyperlink{structLTC__CntrlParams_o2}{rit\-Lo}
\item 
signed short \hyperlink{structLTC__CntrlParams_o3}{rit\-Hi}
\item 
signed short \hyperlink{structLTC__CntrlParams_o4}{delta}
\end{CompactItemize}


\subsection{Detailed Description}
Control algogrithm parameters for a heat pipe. 



\subsection{Field Documentation}
\hypertarget{structLTC__CntrlParams_o4}{
\index{LTC_CntrlParams@{LTC\_\-Cntrl\-Params}!delta@{delta}}
\index{delta@{delta}!LTC_CntrlParams@{LTC\_\-Cntrl\-Params}}
\subsubsection[delta]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__CntrlParams_o4}{LTC\_\-Cntrl\-Params::delta}}}
\label{structLTC__CntrlParams_o4}


delta limit \hypertarget{structLTC__CntrlParams_o1}{
\index{LTC_CntrlParams@{LTC\_\-Cntrl\-Params}!resHi@{resHi}}
\index{resHi@{resHi}!LTC_CntrlParams@{LTC\_\-Cntrl\-Params}}
\subsubsection[resHi]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__CntrlParams_o1}{LTC\_\-Cntrl\-Params::res\-Hi}}}
\label{structLTC__CntrlParams_o1}


high limit for heat pipe reservoir \hypertarget{structLTC__CntrlParams_o0}{
\index{LTC_CntrlParams@{LTC\_\-Cntrl\-Params}!resLo@{resLo}}
\index{resLo@{resLo}!LTC_CntrlParams@{LTC\_\-Cntrl\-Params}}
\subsubsection[resLo]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__CntrlParams_o0}{LTC\_\-Cntrl\-Params::res\-Lo}}}
\label{structLTC__CntrlParams_o0}


low limit heat pipe reservoir \hypertarget{structLTC__CntrlParams_o3}{
\index{LTC_CntrlParams@{LTC\_\-Cntrl\-Params}!ritHi@{ritHi}}
\index{ritHi@{ritHi}!LTC_CntrlParams@{LTC\_\-Cntrl\-Params}}
\subsubsection[ritHi]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__CntrlParams_o3}{LTC\_\-Cntrl\-Params::rit\-Hi}}}
\label{structLTC__CntrlParams_o3}


high limit heat pipe radiator interface temp \hypertarget{structLTC__CntrlParams_o2}{
\index{LTC_CntrlParams@{LTC\_\-Cntrl\-Params}!ritLo@{ritLo}}
\index{ritLo@{ritLo}!LTC_CntrlParams@{LTC\_\-Cntrl\-Params}}
\subsubsection[ritLo]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__CntrlParams_o2}{LTC\_\-Cntrl\-Params::rit\-Lo}}}
\label{structLTC__CntrlParams_o2}


low limit heat pipe radiator interface temp 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
