\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__LTC__DiagLTC__Tlm}{\_\-LTC\_\-Diag\-LTC\_\-Tlm} (LAT Thermal Control diagnostic telemetry $\backslash$ APID 0x2da )}{\pageref{struct__LTC__DiagLTC__Tlm}}{}
\item\contentsline{section}{\hyperlink{union__LTC__HeaterCommand}{\_\-LTC\_\-Heater\-Command} (Union for telemetry bitfield \hyperlink{struct__LTC__HeaterCommand__Bfl}{\_\-LTC\_\-Heater\-Command\_\-Bfl} )}{\pageref{union__LTC__HeaterCommand}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__HeaterCommand__Bfl}{\_\-LTC\_\-Heater\-Command\_\-Bfl} (Current heater command and LTC control mode )}{\pageref{struct__LTC__HeaterCommand__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__HeaterMode}{\_\-LTC\_\-Heater\-Mode} (Union for telemetry bitfield \hyperlink{struct__LTC__HeaterMode__Bfl}{\_\-LTC\_\-Heater\-Mode\_\-Bfl} )}{\pageref{union__LTC__HeaterMode}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__HeaterMode__Bfl}{\_\-LTC\_\-Heater\-Mode\_\-Bfl} (Control mode for VHCP heaters )}{\pageref{struct__LTC__HeaterMode__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__HeaterState}{\_\-LTC\_\-Heater\-State} (Union for telemetry bitfield \hyperlink{struct__LTC__HeaterState__Bfl}{\_\-LTC\_\-Heater\-State\_\-Bfl} )}{\pageref{union__LTC__HeaterState}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__HeaterState__Bfl}{\_\-LTC\_\-Heater\-State\_\-Bfl} (Current heater state and LTC run mode )}{\pageref{struct__LTC__HeaterState__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__RawAdcStatus}{\_\-LTC\_\-Raw\-Adc\-Status} (Union for telemetry bitfield \hyperlink{struct__LTC__RawAdcStatus__Bfl}{\_\-LTC\_\-Raw\-Adc\-Status\_\-Bfl} )}{\pageref{union__LTC__RawAdcStatus}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__RawAdcStatus__Bfl}{\_\-LTC\_\-Raw\-Adc\-Status\_\-Bfl} (Sensor Status and ADC Counts )}{\pageref{struct__LTC__RawAdcStatus__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__ResRitSnsrSel}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel} (Union for telemetry bitfield \hyperlink{struct__LTC__ResRitSnsrSel__Bfl}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel\_\-Bfl} )}{\pageref{union__LTC__ResRitSnsrSel}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ResRitSnsrSel__Bfl}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel\_\-Bfl} (Selected RSVR and RIT sensors )}{\pageref{struct__LTC__ResRitSnsrSel__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__ResRitStatus}{\_\-LTC\_\-Res\-Rit\-Status} (Union for telemetry bitfield \hyperlink{struct__LTC__ResRitStatus__Bfl}{\_\-LTC\_\-Res\-Rit\-Status\_\-Bfl} )}{\pageref{union__LTC__ResRitStatus}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ResRitStatus__Bfl}{\_\-LTC\_\-Res\-Rit\-Status\_\-Bfl} (Heat pipe RIT and reservoir sensors status )}{\pageref{struct__LTC__ResRitStatus__Bfl}}{}
\end{CompactList}
