\hypertarget{structLSEC__ctx}{
\section{LSEC\_\-ctx Struct Reference}
\label{structLSEC__ctx}\index{LSEC\_\-ctx@{LSEC\_\-ctx}}
}
Structure defining the calibration context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__ctx_4b6711202c49e65a1cc1f013d7569625}{
unsigned short \hyperlink{structLSEC__ctx_4b6711202c49e65a1cc1f013d7569625}{version}}
\label{structLSEC__ctx_4b6711202c49e65a1cc1f013d7569625}

\begin{CompactList}\small\item\em Version of this structure. \item\end{CompactList}\item 
\hypertarget{structLSEC__ctx_d3944ace090fb507700391002d2af087}{
unsigned short \hyperlink{structLSEC__ctx_d3944ace090fb507700391002d2af087}{mode}}
\label{structLSEC__ctx_d3944ace090fb507700391002d2af087}

\begin{CompactList}\small\item\em One of ACD, CAL or TKR - the calibration mode. \item\end{CompactList}\item 
\hypertarget{structLSEC__ctx_1e47ed3b3421fd751b3fb09d6fb974a6}{
\hyperlink{structLSEC__global}{LSEC\_\-global} \hyperlink{structLSEC__ctx_1e47ed3b3421fd751b3fb09d6fb974a6}{global}}
\label{structLSEC__ctx_1e47ed3b3421fd751b3fb09d6fb974a6}

\begin{CompactList}\small\item\em Context common to all calibration mode. \item\end{CompactList}\item 
\hypertarget{structLSEC__ctx_c7e04b62b0595c2a181619cf6a1a4054}{
\hyperlink{unionLSEC__specific}{LSEC\_\-specific} \hyperlink{structLSEC__ctx_c7e04b62b0595c2a181619cf6a1a4054}{specific}}
\label{structLSEC__ctx_c7e04b62b0595c2a181619cf6a1a4054}

\begin{CompactList}\small\item\em Context specific to this calibration mode. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Structure defining the calibration context. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
