\hypertarget{structLSEC__cal}{
\section{LSEC\_\-cal Struct Reference}
\label{structLSEC__cal}\index{LSEC\_\-cal@{LSEC\_\-cal}}
}
Calorimeter specific context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__cal_e623bb3625d698202c377ff6becf17ec}{
unsigned short \hyperlink{structLSEC__cal_e623bb3625d698202c377ff6becf17ec}{injection}}
\label{structLSEC__cal_e623bb3625d698202c377ff6becf17ec}

\begin{CompactList}\small\item\em Injection DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_a4543336eb793045b489fe8c6dcd61a6}{
unsigned short \hyperlink{structLSEC__cal_a4543336eb793045b489fe8c6dcd61a6}{ULD}}
\label{structLSEC__cal_a4543336eb793045b489fe8c6dcd61a6}

\begin{CompactList}\small\item\em ULD threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_61a1705fae8353459f1a1f8fec147652}{
unsigned short \hyperlink{structLSEC__cal_61a1705fae8353459f1a1f8fec147652}{accept}}
\label{structLSEC__cal_61a1705fae8353459f1a1f8fec147652}

\begin{CompactList}\small\item\em Accept threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_639a38a79a156b31444b88daa484e12c}{
unsigned short \hyperlink{structLSEC__cal_639a38a79a156b31444b88daa484e12c}{low\_\-thresh}}
\label{structLSEC__cal_639a38a79a156b31444b88daa484e12c}

\begin{CompactList}\small\item\em Low energy trigger threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_fba28ae0351c19e29a7d78ebd0a3b43e}{
unsigned short \hyperlink{structLSEC__cal_fba28ae0351c19e29a7d78ebd0a3b43e}{high\_\-thresh}}
\label{structLSEC__cal_fba28ae0351c19e29a7d78ebd0a3b43e}

\begin{CompactList}\small\item\em High energy trigger threshold DAC val. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_6cace4f2a721d53e6450bbf12b243162}{
unsigned short \hyperlink{structLSEC__cal_6cace4f2a721d53e6450bbf12b243162}{TACK\_\-delay}}
\label{structLSEC__cal_6cace4f2a721d53e6450bbf12b243162}

\begin{CompactList}\small\item\em TACK delay. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_fe9d21cb6197449b832b8060feec5052}{
unsigned short \hyperlink{structLSEC__cal_fe9d21cb6197449b832b8060feec5052}{first\_\-range}}
\label{structLSEC__cal_fe9d21cb6197449b832b8060feec5052}

\begin{CompactList}\small\item\em First range. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_4e3c2a2be6ebc075c97222ec63c4569c}{
unsigned short \hyperlink{structLSEC__cal_4e3c2a2be6ebc075c97222ec63c4569c}{low\_\-gain}}
\label{structLSEC__cal_4e3c2a2be6ebc075c97222ec63c4569c}

\begin{CompactList}\small\item\em Low energy gain. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_41726bab301bfaec97200f50a7f32d14}{
unsigned short \hyperlink{structLSEC__cal_41726bab301bfaec97200f50a7f32d14}{high\_\-gain}}
\label{structLSEC__cal_41726bab301bfaec97200f50a7f32d14}

\begin{CompactList}\small\item\em High energy gain. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_9f7a18f741f298a705d7721aae552c58}{
unsigned short \hyperlink{structLSEC__cal_9f7a18f741f298a705d7721aae552c58}{low\_\-rng\_\-ena}}
\label{structLSEC__cal_9f7a18f741f298a705d7721aae552c58}

\begin{CompactList}\small\item\em Low energy range enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_ea48b3376c65f6811d5f70fc28ad6345}{
unsigned short \hyperlink{structLSEC__cal_ea48b3376c65f6811d5f70fc28ad6345}{high\_\-rng\_\-ena}}
\label{structLSEC__cal_ea48b3376c65f6811d5f70fc28ad6345}

\begin{CompactList}\small\item\em High energy range enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_4ff6a5ff33f2fd9f0b92a931dfdef980}{
unsigned short \hyperlink{structLSEC__cal_4ff6a5ff33f2fd9f0b92a931dfdef980}{low\_\-trg\_\-ena}}
\label{structLSEC__cal_4ff6a5ff33f2fd9f0b92a931dfdef980}

\begin{CompactList}\small\item\em Low energy trigger enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_598e16700c32eb327d82c2e6f4082f42}{
unsigned short \hyperlink{structLSEC__cal_598e16700c32eb327d82c2e6f4082f42}{high\_\-trg\_\-ena}}
\label{structLSEC__cal_598e16700c32eb327d82c2e6f4082f42}

\begin{CompactList}\small\item\em High energy trigger enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_ef1d7f9f6d42fc31d024faf44117aae0}{
unsigned short \hyperlink{structLSEC__cal_ef1d7f9f6d42fc31d024faf44117aae0}{low\_\-cal\_\-ena}}
\label{structLSEC__cal_ef1d7f9f6d42fc31d024faf44117aae0}

\begin{CompactList}\small\item\em Low energy calibration enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_843859411a6975a580f304ab3a1512fb}{
unsigned short \hyperlink{structLSEC__cal_843859411a6975a580f304ab3a1512fb}{high\_\-cal\_\-ena}}
\label{structLSEC__cal_843859411a6975a580f304ab3a1512fb}

\begin{CompactList}\small\item\em High energy calibration enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_c75d56c7edb26b40d73ab2eab259ccf1}{
unsigned short \hyperlink{structLSEC__cal_c75d56c7edb26b40d73ab2eab259ccf1}{calib\_\-gain}}
\label{structLSEC__cal_c75d56c7edb26b40d73ab2eab259ccf1}

\begin{CompactList}\small\item\em Calibration gain bit. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_315bf0e27f722a9cdf048975a0c5dea2}{
\hyperlink{structLSEC__channel}{LSEC\_\-channel} \hyperlink{structLSEC__cal_315bf0e27f722a9cdf048975a0c5dea2}{channel}}
\label{structLSEC__cal_315bf0e27f722a9cdf048975a0c5dea2}

\begin{CompactList}\small\item\em Channel mask information. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Calorimeter specific context. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
