\hypertarget{structLSEC__ctx}{
\section{LSEC\_\-ctx Struct Reference}
\label{structLSEC__ctx}\index{LSEC_ctx@{LSEC\_\-ctx}}
}
Structure defining the calibration context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

Collaboration diagram for LSEC\_\-ctx:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=142pt]{structLSEC__ctx__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__ctx_o0}{
unsigned short \hyperlink{structLSEC__ctx_o0}{version}}
\label{structLSEC__ctx_o0}

\begin{CompactList}\small\item\em Version of this structure. \item\end{CompactList}\item 
\hypertarget{structLSEC__ctx_o1}{
unsigned short \hyperlink{structLSEC__ctx_o1}{mode}}
\label{structLSEC__ctx_o1}

\begin{CompactList}\small\item\em One of ACD, CAL or TKR - the calibration mode. \item\end{CompactList}\item 
\hypertarget{structLSEC__ctx_o2}{
\hyperlink{structLSEC__global}{LSEC\_\-global} \hyperlink{structLSEC__ctx_o2}{global}}
\label{structLSEC__ctx_o2}

\begin{CompactList}\small\item\em Context common to all calibration mode. \item\end{CompactList}\item 
\hypertarget{structLSEC__ctx_o3}{
\hyperlink{unionLSEC__specific}{LSEC\_\-specific} \hyperlink{structLSEC__ctx_o3}{specific}}
\label{structLSEC__ctx_o3}

\begin{CompactList}\small\item\em Context specific to this calibration mode. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Structure defining the calibration context. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
