\hypertarget{structLSEC__compressionDesc}{
\section{LSEC\_\-compression\-Desc Struct Reference}
\label{structLSEC__compressionDesc}\index{LSEC_compressionDesc@{LSEC\_\-compressionDesc}}
}
Inital parameters used as part of the description of a compression structure (used when consigning the data).  


{\tt \#include $<$compress\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__compressionDesc_o0}{
unsigned \hyperlink{structLSEC__compressionDesc_o0}{n\_\-entry\_\-bits}: 6}
\label{structLSEC__compressionDesc_o0}

\begin{CompactList}\small\item\em Number of bits used to hold the histogram entries. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_o1}{
unsigned \hyperlink{structLSEC__compressionDesc_o1}{n\_\-delta\_\-bits}: 6}
\label{structLSEC__compressionDesc_o1}

\begin{CompactList}\small\item\em Number of bits used to hold the deltas. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_o2}{
unsigned \hyperlink{structLSEC__compressionDesc_o2}{first\_\-bin}:20}
\label{structLSEC__compressionDesc_o2}

\begin{CompactList}\small\item\em First non-empty bin. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_o3}{
unsigned \hyperlink{structLSEC__compressionDesc_o3}{count}:20}
\label{structLSEC__compressionDesc_o3}

\begin{CompactList}\small\item\em Number of non-empty bins. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_o4}{
unsigned \hyperlink{structLSEC__compressionDesc_o4}{\_\-\_\-pad0\_\-\_\-}:12}
\label{structLSEC__compressionDesc_o4}

\begin{CompactList}\small\item\em Padding. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Inital parameters used as part of the description of a compression structure (used when consigning the data). 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{compress__p_8h}{compress\_\-p.h}\end{CompactItemize}
