\hypertarget{structLSEC__calCompress}{
\section{LSEC\_\-cal\-Compress Struct Reference}
\label{structLSEC__calCompress}\index{LSEC_calCompress@{LSEC\_\-calCompress}}
}
Private structure holding the compression information for the calorimeter.  


{\tt \#include $<$compact\_\-p.h$>$}

Collaboration diagram for LSEC\_\-cal\-Compress:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=82pt]{structLSEC__calCompress__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__calCompress_o0}{
unsigned \hyperlink{structLSEC__calCompress_o0}{range}}
\label{structLSEC__calCompress_o0}

\begin{CompactList}\small\item\em Indicates 4-range or auto-range. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o1}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o1}{towers}}
\label{structLSEC__calCompress_o1}

\begin{CompactList}\small\item\em Compression structure for the tower maps. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o2}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o2}{diagnostics}}
\label{structLSEC__calCompress_o2}

\begin{CompactList}\small\item\em Compression structure for the diagnostic maps. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o3}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o3}{lay\-Cnts}}
\label{structLSEC__calCompress_o3}

\begin{CompactList}\small\item\em The compression structures for the layer counts. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o4}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o4}{columns}}
\label{structLSEC__calCompress_o4}

\begin{CompactList}\small\item\em The compression structures for the log masks. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o5}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o5}{ranges}}
\label{structLSEC__calCompress_o5}

\begin{CompactList}\small\item\em The compression structures for the calorimeter ranges. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o6}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o6}{means} \mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_o6}

\begin{CompactList}\small\item\em The compression structures for the calorimeter log mean values. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o7}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o7}{logs} \mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_o7}

\begin{CompactList}\small\item\em The compression structures for the calormieter log subtracted mean values. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o8}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_o8}{accepts}}
\label{structLSEC__calCompress_o8}

\begin{CompactList}\small\item\em Compression structure for the CAL accepts. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o9}{
unsigned \hyperlink{structLSEC__calCompress_o9}{accum} \mbox{[}LSEC\_\-N\_\-TWR\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-LAY\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-COL\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-END\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_o9}

\begin{CompactList}\small\item\em Accumulation of log values for calculating the mean. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_o10}{
unsigned char \hyperlink{structLSEC__calCompress_o10}{count} \mbox{[}LSEC\_\-N\_\-TWR\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-LAY\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-COL\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-END\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_o10}

\begin{CompactList}\small\item\em Accumulation of log values for calculating the mean. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding the compression information for the calorimeter. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{compact__p_8h}{compact\_\-p.h}\end{CompactItemize}
