\hypertarget{structLSEC__cal}{
\section{LSEC\_\-cal Struct Reference}
\label{structLSEC__cal}\index{LSEC_cal@{LSEC\_\-cal}}
}
Calorimeter specific context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

Collaboration diagram for LSEC\_\-cal:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=63pt]{structLSEC__cal__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__cal_o0}{
unsigned short \hyperlink{structLSEC__cal_o0}{injection}}
\label{structLSEC__cal_o0}

\begin{CompactList}\small\item\em Injection DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o1}{
unsigned short \hyperlink{structLSEC__cal_o1}{ULD}}
\label{structLSEC__cal_o1}

\begin{CompactList}\small\item\em ULD threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o2}{
unsigned short \hyperlink{structLSEC__cal_o2}{accept}}
\label{structLSEC__cal_o2}

\begin{CompactList}\small\item\em Accept threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o3}{
unsigned short \hyperlink{structLSEC__cal_o3}{low\_\-thresh}}
\label{structLSEC__cal_o3}

\begin{CompactList}\small\item\em Low energy trigger threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o4}{
unsigned short \hyperlink{structLSEC__cal_o4}{high\_\-thresh}}
\label{structLSEC__cal_o4}

\begin{CompactList}\small\item\em High energy trigger threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o5}{
unsigned short \hyperlink{structLSEC__cal_o5}{TACK\_\-delay}}
\label{structLSEC__cal_o5}

\begin{CompactList}\small\item\em TACK delay. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o6}{
unsigned short \hyperlink{structLSEC__cal_o6}{first\_\-range}}
\label{structLSEC__cal_o6}

\begin{CompactList}\small\item\em First range. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o7}{
unsigned short \hyperlink{structLSEC__cal_o7}{low\_\-gain}}
\label{structLSEC__cal_o7}

\begin{CompactList}\small\item\em Low energy gain. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o8}{
unsigned short \hyperlink{structLSEC__cal_o8}{high\_\-gain}}
\label{structLSEC__cal_o8}

\begin{CompactList}\small\item\em High energy gain. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o9}{
unsigned short \hyperlink{structLSEC__cal_o9}{low\_\-rng\_\-ena}}
\label{structLSEC__cal_o9}

\begin{CompactList}\small\item\em Low energy range enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o10}{
unsigned short \hyperlink{structLSEC__cal_o10}{high\_\-rng\_\-ena}}
\label{structLSEC__cal_o10}

\begin{CompactList}\small\item\em High energy range enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o11}{
unsigned short \hyperlink{structLSEC__cal_o11}{low\_\-trg\_\-ena}}
\label{structLSEC__cal_o11}

\begin{CompactList}\small\item\em Low energy trigger enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o12}{
unsigned short \hyperlink{structLSEC__cal_o12}{high\_\-trg\_\-ena}}
\label{structLSEC__cal_o12}

\begin{CompactList}\small\item\em High energy trigger enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o13}{
unsigned short \hyperlink{structLSEC__cal_o13}{low\_\-cal\_\-ena}}
\label{structLSEC__cal_o13}

\begin{CompactList}\small\item\em Low energy calibration enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o14}{
unsigned short \hyperlink{structLSEC__cal_o14}{high\_\-cal\_\-ena}}
\label{structLSEC__cal_o14}

\begin{CompactList}\small\item\em High energy calibration enable. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o15}{
unsigned short \hyperlink{structLSEC__cal_o15}{calib\_\-gain}}
\label{structLSEC__cal_o15}

\begin{CompactList}\small\item\em Calibration gain bit. \item\end{CompactList}\item 
\hypertarget{structLSEC__cal_o16}{
\hyperlink{structLSEC__channel}{LSEC\_\-channel} \hyperlink{structLSEC__cal_o16}{channel}}
\label{structLSEC__cal_o16}

\begin{CompactList}\small\item\em Channel mask information. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Calorimeter specific context. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
