\hypertarget{structLSEC__acdRaw}{
\section{LSEC\_\-acd\-Raw Struct Reference}
\label{structLSEC__acdRaw}\index{LSEC_acdRaw@{LSEC\_\-acdRaw}}
}
Private structure holding raw data for an ACD contribution.  


{\tt \#include $<$acdraw.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__acdRaw_o0}{
unsigned short int \hyperlink{structLSEC__acdRaw_o0}{present}}
\label{structLSEC__acdRaw_o0}

\begin{CompactList}\small\item\em Map of cables present in the ACD contribution. \item\end{CompactList}\item 
\hypertarget{structLSEC__acdRaw_o1}{
unsigned short int \hyperlink{structLSEC__acdRaw_o1}{nchns}}
\label{structLSEC__acdRaw_o1}

\begin{CompactList}\small\item\em Number of channels in the ACD contribution. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding raw data for an ACD contribution. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{acdraw_8h}{acdraw.h}\end{CompactItemize}
