\hypertarget{structLSEC__acd}{
\section{LSEC\_\-acd Struct Reference}
\label{structLSEC__acd}\index{LSEC_acd@{LSEC\_\-acd}}
}
ACD specific context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

Collaboration diagram for LSEC\_\-acd:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=63pt]{structLSEC__acd__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__acd_o0}{
unsigned short \hyperlink{structLSEC__acd_o0}{injection}}
\label{structLSEC__acd_o0}

\begin{CompactList}\small\item\em Injection DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o1}{
unsigned short \hyperlink{structLSEC__acd_o1}{HLD}}
\label{structLSEC__acd_o1}

\begin{CompactList}\small\item\em HLD threshold DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o2}{
unsigned short \hyperlink{structLSEC__acd_o2}{veto\_\-vernier}}
\label{structLSEC__acd_o2}

\begin{CompactList}\small\item\em Veto vernier DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o3}{
unsigned short \hyperlink{structLSEC__acd_o3}{veto}}
\label{structLSEC__acd_o3}

\begin{CompactList}\small\item\em Veto DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o4}{
unsigned short \hyperlink{structLSEC__acd_o4}{PHA}}
\label{structLSEC__acd_o4}

\begin{CompactList}\small\item\em PHA DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o5}{
unsigned short \hyperlink{structLSEC__acd_o5}{bias\_\-dac}}
\label{structLSEC__acd_o5}

\begin{CompactList}\small\item\em Bias DAC value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o6}{
unsigned short \hyperlink{structLSEC__acd_o6}{hold\_\-delay}}
\label{structLSEC__acd_o6}

\begin{CompactList}\small\item\em Hold delay value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o7}{
unsigned short \hyperlink{structLSEC__acd_o7}{hitmap\_\-delay}}
\label{structLSEC__acd_o7}

\begin{CompactList}\small\item\em Hitmap delay value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o8}{
unsigned short \hyperlink{structLSEC__acd_o8}{range}}
\label{structLSEC__acd_o8}

\begin{CompactList}\small\item\em Range bit value. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o9}{
unsigned short \hyperlink{structLSEC__acd_o9}{mbz}}
\label{structLSEC__acd_o9}

\begin{CompactList}\small\item\em Padding. \item\end{CompactList}\item 
\hypertarget{structLSEC__acd_o10}{
\hyperlink{structLSEC__channel}{LSEC\_\-channel} \hyperlink{structLSEC__acd_o10}{channel}}
\label{structLSEC__acd_o10}

\begin{CompactList}\small\item\em Channel masking information. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
ACD specific context. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
