\hypertarget{structLSEC__calEvent}{
\section{LSEC\_\-calEvent Struct Reference}
\label{structLSEC__calEvent}\index{LSEC_calEvent@{LSEC\_\-calEvent}}
}
Private structure holding unencoded event data for the calorimeter.  


{\tt \#include $<$compact.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__calEvent_3bacfbad111d6c17edaa0ebc27d1caa1}{
unsigned int \hyperlink{structLSEC__calEvent_3bacfbad111d6c17edaa0ebc27d1caa1}{twrMap}}
\label{structLSEC__calEvent_3bacfbad111d6c17edaa0ebc27d1caa1}

\begin{CompactList}\small\item\em Map of towers present. \item\end{CompactList}\item 
\hypertarget{structLSEC__calEvent_b847cc1c2f4c00cd5e05661b14a278d4}{
unsigned int \hyperlink{structLSEC__calEvent_b847cc1c2f4c00cd5e05661b14a278d4}{diagMap}}
\label{structLSEC__calEvent_b847cc1c2f4c00cd5e05661b14a278d4}

\begin{CompactList}\small\item\em Map of towers with diagnostics/errors. \item\end{CompactList}\item 
\hypertarget{structLSEC__calEvent_7c7a851f211193aaae94ad22ce90c521}{
unsigned int \hyperlink{structLSEC__calEvent_7c7a851f211193aaae94ad22ce90c521}{logMap} \mbox{[}LSEC\_\-N\_\-TWR\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-LAY $\ast$LSEC\_\-N\_\-CAL\_\-COL/8/sizeof(int)\mbox{]}}
\label{structLSEC__calEvent_7c7a851f211193aaae94ad22ce90c521}

\begin{CompactList}\small\item\em Bit map of logs present. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding unencoded event data for the calorimeter. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{compact_8h}{compact.h}\end{CompactItemize}
