\hypertarget{structLSEC__global}{
\section{LSEC\_\-global Struct Reference}
\label{structLSEC__global}\index{LSEC_global@{LSEC\_\-global}}
}
Context of the calibration common to all modes.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__global_43322f2037e3d261dbc2b06d5e0aeca9}{
unsigned \hyperlink{structLSEC__global_43322f2037e3d261dbc2b06d5e0aeca9}{latc\_\-cfg}}
\label{structLSEC__global_43322f2037e3d261dbc2b06d5e0aeca9}

\begin{CompactList}\small\item\em File key for the LATC configuration master used to configure the LAT. \item\end{CompactList}\item 
\hypertarget{structLSEC__global_fde4dd56e7453f27ea0ff83e1279ec63}{
unsigned \hyperlink{structLSEC__global_fde4dd56e7453f27ea0ff83e1279ec63}{lci\_\-cfg}}
\label{structLSEC__global_fde4dd56e7453f27ea0ff83e1279ec63}

\begin{CompactList}\small\item\em File key for the LCI configuration file. \item\end{CompactList}\item 
\hypertarget{structLSEC__global_24ebe253b1aec1944e0e783948229e9c}{
unsigned \hyperlink{structLSEC__global_24ebe253b1aec1944e0e783948229e9c}{\_\-\_\-pad0\_\-\_\-}: 5}
\label{structLSEC__global_24ebe253b1aec1944e0e783948229e9c}

\begin{CompactList}\small\item\em padding \item\end{CompactList}\item 
\hypertarget{structLSEC__global_b369b75a5a8a7a304368744e8df4cadd}{
unsigned \hyperlink{structLSEC__global_b369b75a5a8a7a304368744e8df4cadd}{auto\_\-range}: 1}
\label{structLSEC__global_b369b75a5a8a7a304368744e8df4cadd}

\begin{CompactList}\small\item\em Auto range bit of the TAM. \item\end{CompactList}\item 
\hypertarget{structLSEC__global_902728b25c779212f70b9f4b1c841ecf}{
unsigned \hyperlink{structLSEC__global_902728b25c779212f70b9f4b1c841ecf}{zero\_\-suppress}: 1}
\label{structLSEC__global_902728b25c779212f70b9f4b1c841ecf}

\begin{CompactList}\small\item\em Zero-suppress bit of the TAM. \item\end{CompactList}\item 
\hypertarget{structLSEC__global_c75c72acbe9b606e49b77060d7f244ce}{
unsigned \hyperlink{structLSEC__global_c75c72acbe9b606e49b77060d7f244ce}{strobe}: 1}
\label{structLSEC__global_c75c72acbe9b606e49b77060d7f244ce}

\begin{CompactList}\small\item\em CALSTROBE bit of the TAM. \item\end{CompactList}\item 
\hypertarget{structLSEC__global_56439e6c5a7943d9385dcad5199120ca}{
unsigned \hyperlink{structLSEC__global_56439e6c5a7943d9385dcad5199120ca}{period}:24}
\label{structLSEC__global_56439e6c5a7943d9385dcad5199120ca}

\begin{CompactList}\small\item\em Periodic rate of the data collection. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Context of the calibration common to all modes. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
