\hypertarget{structLSEC__compressionDesc}{
\section{LSEC\_\-compressionDesc Struct Reference}
\label{structLSEC__compressionDesc}\index{LSEC_compressionDesc@{LSEC\_\-compressionDesc}}
}
Inital parameters used as part of the description of a compression structure (used when consigning the data).  


{\tt \#include $<$compress\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__compressionDesc_1a9cc46113468710172f593e04b5767b}{
unsigned \hyperlink{structLSEC__compressionDesc_1a9cc46113468710172f593e04b5767b}{n\_\-entry\_\-bits}: 6}
\label{structLSEC__compressionDesc_1a9cc46113468710172f593e04b5767b}

\begin{CompactList}\small\item\em Number of bits used to hold the histogram entries. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_1632b5fbe322f7a4cb26419b4aa46c61}{
unsigned \hyperlink{structLSEC__compressionDesc_1632b5fbe322f7a4cb26419b4aa46c61}{n\_\-delta\_\-bits}: 6}
\label{structLSEC__compressionDesc_1632b5fbe322f7a4cb26419b4aa46c61}

\begin{CompactList}\small\item\em Number of bits used to hold the deltas. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_ead9b631c54b61668c7521d7527853cd}{
unsigned \hyperlink{structLSEC__compressionDesc_ead9b631c54b61668c7521d7527853cd}{first\_\-bin}:20}
\label{structLSEC__compressionDesc_ead9b631c54b61668c7521d7527853cd}

\begin{CompactList}\small\item\em First non-empty bin. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_82fd5acbabdeccdafcd690967e1e40a9}{
unsigned \hyperlink{structLSEC__compressionDesc_82fd5acbabdeccdafcd690967e1e40a9}{count}:20}
\label{structLSEC__compressionDesc_82fd5acbabdeccdafcd690967e1e40a9}

\begin{CompactList}\small\item\em Number of non-empty bins. \item\end{CompactList}\item 
\hypertarget{structLSEC__compressionDesc_fcde2affa28bc7e22781bc377f79946b}{
unsigned \hyperlink{structLSEC__compressionDesc_fcde2affa28bc7e22781bc377f79946b}{\_\-\_\-pad0\_\-\_\-}:12}
\label{structLSEC__compressionDesc_fcde2affa28bc7e22781bc377f79946b}

\begin{CompactList}\small\item\em Padding. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Inital parameters used as part of the description of a compression structure (used when consigning the data). 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{compress__p_8h}{compress\_\-p.h}\end{CompactItemize}
