\hypertarget{structLSEC__calCompress}{
\section{LSEC\_\-calCompress Struct Reference}
\label{structLSEC__calCompress}\index{LSEC_calCompress@{LSEC\_\-calCompress}}
}
Private structure holding the compression information for the calorimeter.  


{\tt \#include $<$compact\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__calCompress_7b732c8ec6196a55f5bce12ae551eeca}{
unsigned \hyperlink{structLSEC__calCompress_7b732c8ec6196a55f5bce12ae551eeca}{range}}
\label{structLSEC__calCompress_7b732c8ec6196a55f5bce12ae551eeca}

\begin{CompactList}\small\item\em Indicates 4-range or auto-range. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_561b3df6b49435145f9e6630ecf3643b}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_561b3df6b49435145f9e6630ecf3643b}{towers}}
\label{structLSEC__calCompress_561b3df6b49435145f9e6630ecf3643b}

\begin{CompactList}\small\item\em Compression structure for the tower maps. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_e345798a45df857be097dd1770a1b1b5}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_e345798a45df857be097dd1770a1b1b5}{diagnostics}}
\label{structLSEC__calCompress_e345798a45df857be097dd1770a1b1b5}

\begin{CompactList}\small\item\em Compression structure for the diagnostic maps. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_bbd72d8d3ecc21a3ee77ccaad319705e}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_bbd72d8d3ecc21a3ee77ccaad319705e}{layCnts}}
\label{structLSEC__calCompress_bbd72d8d3ecc21a3ee77ccaad319705e}

\begin{CompactList}\small\item\em The compression structures for the layer counts. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_11059c31d541408f22f055ccc540b9c1}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_11059c31d541408f22f055ccc540b9c1}{columns}}
\label{structLSEC__calCompress_11059c31d541408f22f055ccc540b9c1}

\begin{CompactList}\small\item\em The compression structures for the log masks. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_0cdfe419790f06f5c401d075500a9281}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_0cdfe419790f06f5c401d075500a9281}{ranges}}
\label{structLSEC__calCompress_0cdfe419790f06f5c401d075500a9281}

\begin{CompactList}\small\item\em The compression structures for the calorimeter ranges. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_d725d1c0264aae1f3002aa17475e3272}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_d725d1c0264aae1f3002aa17475e3272}{means} \mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_d725d1c0264aae1f3002aa17475e3272}

\begin{CompactList}\small\item\em The compression structures for the calorimeter log mean values. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_475f16152446b95113bc2ed3afe32fcf}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_475f16152446b95113bc2ed3afe32fcf}{logs} \mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_475f16152446b95113bc2ed3afe32fcf}

\begin{CompactList}\small\item\em The compression structures for the calormieter log subtracted mean values. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_4653e663c64207f297a65561c354a00d}{
\hyperlink{structLSEC__compression__}{LSEC\_\-compression} $\ast$ \hyperlink{structLSEC__calCompress_4653e663c64207f297a65561c354a00d}{accepts}}
\label{structLSEC__calCompress_4653e663c64207f297a65561c354a00d}

\begin{CompactList}\small\item\em Compression structure for the CAL accepts. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_8648a847e9815bb03859259d24dadf3a}{
unsigned \hyperlink{structLSEC__calCompress_8648a847e9815bb03859259d24dadf3a}{accum} \mbox{[}LSEC\_\-N\_\-TWR\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-LAY\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-COL\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-END\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_8648a847e9815bb03859259d24dadf3a}

\begin{CompactList}\small\item\em Accumulation of log values for calculating the mean. \item\end{CompactList}\item 
\hypertarget{structLSEC__calCompress_c52cff8565136eca175bee88b0317baa}{
unsigned char \hyperlink{structLSEC__calCompress_c52cff8565136eca175bee88b0317baa}{count} \mbox{[}LSEC\_\-N\_\-TWR\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-LAY\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-COL\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-END\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structLSEC__calCompress_c52cff8565136eca175bee88b0317baa}

\begin{CompactList}\small\item\em Accumulation of log values for calculating the mean. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding the compression information for the calorimeter. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{compact__p_8h}{compact\_\-p.h}\end{CompactItemize}
