\hypertarget{structLSEC__acdRaw}{
\section{LSEC\_\-acdRaw Struct Reference}
\label{structLSEC__acdRaw}\index{LSEC_acdRaw@{LSEC\_\-acdRaw}}
}
Private structure holding raw data for an ACD contribution.  


{\tt \#include $<$acdraw.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__acdRaw_107266d2152cac3b7be947758c74f530}{
unsigned short int \hyperlink{structLSEC__acdRaw_107266d2152cac3b7be947758c74f530}{present}}
\label{structLSEC__acdRaw_107266d2152cac3b7be947758c74f530}

\begin{CompactList}\small\item\em Map of cables present in the ACD contribution. \item\end{CompactList}\item 
\hypertarget{structLSEC__acdRaw_6feb77ef15797be2d01b10895345635f}{
unsigned short int \hyperlink{structLSEC__acdRaw_6feb77ef15797be2d01b10895345635f}{nchns}}
\label{structLSEC__acdRaw_6feb77ef15797be2d01b10895345635f}

\begin{CompactList}\small\item\em Number of channels in the ACD contribution. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding raw data for an ACD contribution. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{acdraw_8h}{acdraw.h}\end{CompactItemize}
