\hypertarget{structLSEC__cal}{
\section{LSEC\_\-cal Struct Reference}
\label{structLSEC__cal}\index{LSEC_cal@{LSEC\_\-cal}}
}
Calorimeter specific context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

Collaboration diagram for LSEC\_\-cal:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=63pt]{structLSEC__cal__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLSEC__cal_o0}{
\hyperlink{structLSEC__channel}{LSEC\_\-channel} \hyperlink{structLSEC__cal_o0}{channel}}
\label{structLSEC__cal_o0}

\begin{CompactList}\small\item\em Channel mask information. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Calorimeter specific context. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
