\hypertarget{structLSEC__ctx}{
\section{LSEC\_\-ctx Struct Reference}
\label{structLSEC__ctx}\index{LSEC_ctx@{LSEC\_\-ctx}}
}
Structure defining the calibration context.  


{\tt \#include $<$LSEC\_\-ctx.h$>$}

Collaboration diagram for LSEC\_\-ctx:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=142pt]{structLSEC__ctx__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
unsigned \hyperlink{structLSEC__ctx_o0}{mode}
\item 
\hyperlink{structLSEC__global}{LSEC\_\-global} \hyperlink{structLSEC__ctx_o1}{global}
\item 
\hyperlink{unionLSEC__specific}{LSEC\_\-specific} \hyperlink{structLSEC__ctx_o2}{specific}
\end{CompactItemize}


\subsection{Detailed Description}
Structure defining the calibration context. 



\subsection{Field Documentation}
\hypertarget{structLSEC__ctx_o1}{
\index{LSEC_ctx@{LSEC\_\-ctx}!global@{global}}
\index{global@{global}!LSEC_ctx@{LSEC\_\-ctx}}
\subsubsection[global]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLSEC__global}{LSEC\_\-global} \hyperlink{structLSEC__ctx_o1}{LSEC\_\-ctx::global}}}
\label{structLSEC__ctx_o1}


Context common to all calibration mode \hypertarget{structLSEC__ctx_o0}{
\index{LSEC_ctx@{LSEC\_\-ctx}!mode@{mode}}
\index{mode@{mode}!LSEC_ctx@{LSEC\_\-ctx}}
\subsubsection[mode]{\setlength{\rightskip}{0pt plus 5cm}unsigned \hyperlink{structLSEC__ctx_o0}{LSEC\_\-ctx::mode}}}
\label{structLSEC__ctx_o0}


One of ACD, CAL or TKR - the calibration mode that generated the context \hypertarget{structLSEC__ctx_o2}{
\index{LSEC_ctx@{LSEC\_\-ctx}!specific@{specific}}
\index{specific@{specific}!LSEC_ctx@{LSEC\_\-ctx}}
\subsubsection[specific]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{unionLSEC__specific}{LSEC\_\-specific} \hyperlink{structLSEC__ctx_o2}{LSEC\_\-ctx::specific}}}
\label{structLSEC__ctx_o2}


Context specific to this calibration mode 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LSEC__ctx_8h}{LSEC\_\-ctx.h}\end{CompactItemize}
