\hypertarget{dir_afc1331eebb97cf4265e52994e8ae25f}{
\section{/afs/slac.stanford.edu/g/glast/flight/APP/source/LSE/V2-0-4/LSE/ Directory Reference}
\label{dir_afc1331eebb97cf4265e52994e8ae25f}\index{/afs/slac.stanford.edu/g/glast/flight/APP/source/LSE/V2-0-4/LSE/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/APP/source/LSE/V2-0-4/LSE/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{CDF__acd_8h}{CDF\_\-acd.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the ACD contributor and the ACD portion of the GEM. \item\end{CompactList}

\item 
file \hyperlink{CDF__acd__maps_8h}{CDF\_\-acd\_\-maps.h}
\begin{CompactList}\small\item\em Contains pre-canned maps for the ACD packing. \item\end{CompactList}

\item 
file \hyperlink{CDF__acd__ped_8h}{CDF\_\-acd\_\-ped.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the AEM contributor when zero suppression is disabled. \item\end{CompactList}

\item 
file \hyperlink{CDF__acd__std_8h}{CDF\_\-acd\_\-std.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the AEM contributor when in normal readout (zero suppression enabled) mode. \item\end{CompactList}

\item 
file \hyperlink{CDF__acddef_8h}{CDF\_\-acddef.h}
\begin{CompactList}\small\item\em Semi-Public structures used in decoding the ACD compressed data These should only be included by encoding/decoding utilities. \item\end{CompactList}

\item 
file \hyperlink{cdf__buf__print_8h}{cdf\_\-buf\_\-print.h}
\begin{CompactList}\small\item\em Print of the buffer, for debugging purposes. \item\end{CompactList}

\item 
file \hyperlink{CDF__cal_8h}{CDF\_\-cal.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the CAL contributor. \item\end{CompactList}

\item 
file \hyperlink{CDF__cal__ped_8h}{CDF\_\-cal\_\-ped.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the CAL contributors when zero suppression is disabled. This may be either single or 4 range readout. \item\end{CompactList}

\item 
file \hyperlink{CDF__cal__prd__model_8h}{CDF\_\-cal\_\-prd\_\-model.h}
\begin{CompactList}\small\item\em Interface to the CAL range predictor functions. In particular this is the prediction model that must be in common between the encode and decode sides. \item\end{CompactList}

\item 
file \hyperlink{CDF__cal__std_8h}{CDF\_\-cal\_\-std.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the CAL contributor when in normal readout (zero suppression enabled, 4-range readout disabled) mode. \item\end{CompactList}

\item 
file \hyperlink{CDF__caldef_8h}{CDF\_\-caldef.h}
\begin{CompactList}\small\item\em Semi-Public structures used in decoding the CAL compressed data These should only be included by encoding/decoding utilities. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn_8h}{CDF\_\-dgn.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the diagnostic contributions. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn__ped_8h}{CDF\_\-dgn\_\-ped.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the diagnostic contributions for pedestal events. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn__ped__cal_8h}{CDF\_\-dgn\_\-ped\_\-cal.h}
\begin{CompactList}\small\item\em Compresssion context for the CAL diagnostic contribution. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn__ped__tkr_8h}{CDF\_\-dgn\_\-ped\_\-tkr.h}
\begin{CompactList}\small\item\em Interface to the routines to compress the TKR diagnostic bits in pedestal readout mode. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn__std_8h}{CDF\_\-dgn\_\-std.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the diagnostic contributions. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn__std__cal_8h}{CDF\_\-dgn\_\-std\_\-cal.h}
\begin{CompactList}\small\item\em Compresssion context for the CAL diagnostic contribution. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgn__std__tkr_8h}{CDF\_\-dgn\_\-std\_\-tkr.h}
\begin{CompactList}\small\item\em Interface to the routines to compress the TKR diagnostic bits in standard readout mode. \item\end{CompactList}

\item 
file \hyperlink{CDF__dgndef_8h}{CDF\_\-dgndef.h}
\begin{CompactList}\small\item\em Semi-Public structures used in decoding the DGN compressed data These should only be included by encoding/decoding utilities. \item\end{CompactList}

\item 
file \hyperlink{CDF__err_8h}{CDF\_\-err.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the diagnostic contributions. \item\end{CompactList}

\item 
file \hyperlink{CDF__errdef_8h}{CDF\_\-errdef.h}
\begin{CompactList}\small\item\em Semi-Public structures used in decoding the ERROR compressed data These should only be included by encoding/decoding utilities. \item\end{CompactList}

\item 
file \hyperlink{CDF__esb_8h}{CDF\_\-esb.h}
\begin{CompactList}\small\item\em Interface to the routines used to manipulate the Event Summary Block. \item\end{CompactList}

\item 
file \hyperlink{CDF__gem_8h}{CDF\_\-gem.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the GEM contributor. \item\end{CompactList}

\item 
file \hyperlink{CDF__gemdef_8h}{CDF\_\-gemdef.h}
\begin{CompactList}\small\item\em Semi-Public structures used in decoding the GEM compressed data These should only be included by encoding/decoding utilities. \item\end{CompactList}

\item 
file \hyperlink{CDF__tkr_8h}{CDF\_\-tkr.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the TKR contributor. \item\end{CompactList}

\item 
file \hyperlink{CDF__tkr__err_8h}{CDF\_\-tkr\_\-err.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the TKR tracker towers that are in error. \item\end{CompactList}

\item 
file \hyperlink{CDF__tkr__ped_8h}{CDF\_\-tkr\_\-ped.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the TKR for pedestal events. \item\end{CompactList}

\item 
file \hyperlink{CDF__tkr__std_8h}{CDF\_\-tkr\_\-std.h}
\begin{CompactList}\small\item\em Public interface to produce Compressed Data Format for the TKR for standard physics events. \item\end{CompactList}

\item 
file \hyperlink{CDF__tkrdef_8h}{CDF\_\-tkrdef.h}
\begin{CompactList}\small\item\em Semi-Public structures used in decoding the TKR compressed data These should only be included by encoding/decoding utilities. \item\end{CompactList}

\item 
file \hyperlink{LFR__key_8h}{LFR\_\-key.h}
\begin{CompactList}\small\item\em Interface to the LAT File Resolution Keys. \item\end{CompactList}

\item 
file \hyperlink{LFR__refdef_8h}{LFR\_\-refdef.h}
\begin{CompactList}\small\item\em Lays out the structure of the a file reference. This structure is meant to provide enough information to be able to locate the ground version of the origin file. \item\end{CompactList}

\item 
file \hyperlink{LSE__cdm_8h}{LSE\_\-cdm.h}
\begin{CompactList}\small\item\em \begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu} \end{Desc}
\item\end{CompactList}

\item 
file \hyperlink{LSE__did_8h}{LSE\_\-did.h}
\begin{CompactList}\small\item\em Defines the Data Identifier used to uniquely tag every data packet. \item\end{CompactList}

\item 
file \hyperlink{LSE__etxBdy_8h}{LSE\_\-etxBdy.h}
\begin{CompactList}\small\item\em Defines the body Event Context Contribution. \item\end{CompactList}

\item 
file \hyperlink{LSE__etxCtb_8h}{LSE\_\-etxCtb.h}
\begin{CompactList}\small\item\em Defines the Event Context Contribution context. \item\end{CompactList}

\item 
file \hyperlink{LSE__ids_8h}{LSE\_\-ids.h}
\begin{CompactList}\small\item\em LAT Science Data Standard Identifiers. \item\end{CompactList}

\item 
file \hyperlink{LSE__timBdy_8h}{LSE\_\-timBdy.h}
\begin{CompactList}\small\item\em Defines the body of a Time Specification Contribution. \item\end{CompactList}

\item 
file \hyperlink{LSE__timCtb_8h}{LSE\_\-timCtb.h}
\begin{CompactList}\small\item\em Defines the Time Specification Contribution context. \item\end{CompactList}

\item 
file \hyperlink{LSE__time_8h}{LSE\_\-time.h}
\begin{CompactList}\small\item\em Time emulation interface. This is used only for testing. \item\end{CompactList}

\item 
file \hyperlink{LSEW__ctxGem_8h}{LSEW\_\-ctxGem.h}
\begin{CompactList}\small\item\em The GEM counter context. \item\end{CompactList}

\item 
file \hyperlink{LSEW__ctxPub_8h}{LSEW\_\-ctxPub.h}
\begin{CompactList}\small\item\em The semi-public part of the standard datagram context. \item\end{CompactList}

\item 
file \hyperlink{LSEW__ctxTim_8h}{LSEW\_\-ctxTim.h}
\begin{CompactList}\small\item\em The time context, basically the binding of the Spectrum Astro time with the 1 PPS register. \item\end{CompactList}

\item 
file \hyperlink{LSEW__dgm_8h}{LSEW\_\-dgm.h}
\begin{CompactList}\small\item\em Output events. \item\end{CompactList}

\item 
file \hyperlink{LSEW__dgmFw_8h}{LSEW\_\-dgmFw.h}
\begin{CompactList}\small\item\em Output events using a framework built around the LSEW\_\-dgm utilities. \item\end{CompactList}

\end{CompactItemize}
