\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__AEM__Control}{\_\-AEM\_\-Control} (Control structure for AEM environmental readout )}{\pageref{struct__AEM__Control}}{}
\item\contentsline{section}{\hyperlink{struct__ITC__QueueItem}{\_\-ITC\_\-Queue\-Item} (Forward reference for struct \_\-ITC\_\-Queue\-Item )}{\pageref{struct__ITC__QueueItem}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Control}{\_\-LIH\_\-Control} (Structure of trace control block )}{\pageref{struct__LIH__Control}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Database}{\_\-LIH\_\-Database} (Packet database. Acquisition fills it, housekeeping copies from it )}{\pageref{struct__LIH__Database}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Device}{\_\-LIH\_\-Device} (Storage to capture a device's acquisition methods/cycle count )}{\pageref{struct__LIH__Device}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__DifferEBM}{\_\-LIH\_\-Differ\-EBM} (Structure used to differ two EBM statistics records )}{\pageref{struct__LIH__DifferEBM}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__EnableLimitsAdc__Pkt}{\_\-LIH\_\-Enable\-Limits\-Adc\_\-Pkt} (Enable/disable limit checking for an ADC $\backslash$ APID 0x654 $\backslash$ function code 2 )}{\pageref{struct__LIH__EnableLimitsAdc__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__EnableLimitsAdc__Prm}{\_\-LIH\_\-Enable\-Limits\-Adc\_\-Prm} (Enable/disable limit checking for an ADC $\backslash$ APID 0x654 $\backslash$ function code 2 )}{\pageref{struct__LIH__EnableLimitsAdc__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__LimitADC__Tlm}{\_\-LIH\_\-Limit\-ADC\_\-Tlm} (Limits/actions associated with a single ADC $\backslash$ APID 0x2c6 )}{\pageref{struct__LIH__LimitADC__Tlm}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__LimitAlert__Tlm}{\_\-LIH\_\-Limit\-Alert\_\-Tlm} (ADC outside limits alert packet $\backslash$ APID 0x354 )}{\pageref{struct__LIH__LimitAlert__Tlm}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__LimitSave}{\_\-LIH\_\-Limit\-Save} (Structure to save limit checking variables cycle to cycle )}{\pageref{struct__LIH__LimitSave}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__LoadLimits__Pkt}{\_\-LIH\_\-Load\-Limits\_\-Pkt} (Load ADC limit sets from CDM database $\backslash$ APID 0x654 $\backslash$ function code 1 )}{\pageref{struct__LIH__LoadLimits__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__LoadLimits__Prm}{\_\-LIH\_\-Load\-Limits\_\-Prm} (Load ADC limit sets from CDM database $\backslash$ APID 0x654 $\backslash$ function code 1 )}{\pageref{struct__LIH__LoadLimits__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Message}{\_\-LIH\_\-Message} (Structure of a fork message to tickle the hardware monitoring task )}{\pageref{struct__LIH__Message}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Noop__Pkt}{\_\-LIH\_\-Noop\_\-Pkt} (No operation $\backslash$ APID 0x654 $\backslash$ function code 0 )}{\pageref{struct__LIH__Noop__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Packet}{\_\-LIH\_\-Packet} (Structure of a generic hardware monitoring housekeeping packet )}{\pageref{struct__LIH__Packet}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Put}{\_\-LIH\_\-Put} (Mapping from hardware ADC to placement in hardware packet database )}{\pageref{struct__LIH__Put}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__SetLimitsAdc__Pkt}{\_\-LIH\_\-Set\-Limits\-Adc\_\-Pkt} (Set limits on an ADC $\backslash$ APID 0x654 $\backslash$ function code 3 )}{\pageref{struct__LIH__SetLimitsAdc__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__SetLimitsAdc__Prm}{\_\-LIH\_\-Set\-Limits\-Adc\_\-Prm} (Set limits on an ADC $\backslash$ APID 0x654 $\backslash$ function code 3 )}{\pageref{struct__LIH__SetLimitsAdc__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LIH__Source}{\_\-LIH\_\-Source} (Structure to ADC enumeration to hardware source )}{\pageref{struct__LIH__Source}}{}
\item\contentsline{section}{\hyperlink{struct__PDU__Control}{\_\-PDU\_\-Control} (Control structure for PDU environmental readout )}{\pageref{struct__PDU__Control}}{}
\item\contentsline{section}{\hyperlink{struct__TEM__Control}{\_\-TEM\_\-Control} (Control structure for TEM environmental readout )}{\pageref{struct__TEM__Control}}{}
\end{CompactList}
