\hypertarget{dir_000008}{
\section{/afs/slac.stanford.edu/g/glast/flight/APP/source/LHK/V11-4-2/src/ Directory Reference}
\label{dir_000008}\index{/afs/slac.stanford.edu/g/glast/flight/APP/source/LHK/V11-4-2/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/APP/source/LHK/V11-4-2/src/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000008_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{LHK__cfg__file_8c}{LHK\_\-cfg\_\-file.c}
\begin{CompactList}\small\item\em Implements LHK configuration file handling. \item\end{CompactList}

\item 
file \hyperlink{LHK__cfg__p_8h}{LHK\_\-cfg\_\-p.h}
\begin{CompactList}\small\item\em Private definitions for LHK configuration. \item\end{CompactList}

\item 
file \hyperlink{LHK__cmd_8c}{LHK\_\-cmd.c}
\begin{CompactList}\small\item\em Routines associated with CCSDS commands to subsystem LHK. \item\end{CompactList}

\item 
file \hyperlink{LHK__cmddecl_8c}{LHK\_\-cmddecl.c}
\begin{CompactList}\small\item\em ITC command dispatch structures to subsystem LHK $\backslash$ This file was auto-generated on Mon 13 Aug 2007 04:42:17 PM PDT $\backslash$ LCAT version: V1-21-8. \item\end{CompactList}

\item 
file \hyperlink{LHK__ctl_8c}{LHK\_\-ctl.c}
\begin{CompactList}\small\item\em Implements application command and control. \item\end{CompactList}

\item 
file \hyperlink{LHK__decode_8c}{LHK\_\-decode.c}
\begin{CompactList}\small\item\em Implements housekeeping data decoding into packet storage. \item\end{CompactList}

\item 
file \hyperlink{LHK__encode_8c}{LHK\_\-encode.c}
\begin{CompactList}\small\item\em Implements LHK acquisition encoding. \item\end{CompactList}

\item 
file \hyperlink{LHK__lcb__p_8h}{LHK\_\-lcb\_\-p.h}
\begin{CompactList}\small\item\em Private definitions for LCB command and result lists. \item\end{CompactList}

\item 
file \hyperlink{LHK__lim_8c}{LHK\_\-lim.c}
\begin{CompactList}\small\item\em Implements limit threshold checking for housekeeping monitor points. \item\end{CompactList}

\item 
file \hyperlink{LHK__msgs_8c}{LHK\_\-msgs.c}
\begin{CompactList}\small\item\em Constructor/destructor routines for message facility {\bf LHK} (ID: {\tt 49}, {\tt 0x31}). \item\end{CompactList}

\item 
file \hyperlink{LHK__p_8h}{LHK\_\-p.h}
\begin{CompactList}\small\item\em Private definitions for LAT housekeeping. \item\end{CompactList}

\item 
file \hyperlink{LHK__pkt_8c}{LHK\_\-pkt.c}
\begin{CompactList}\small\item\em Implements packetization for LAT housekeeping. \item\end{CompactList}

\item 
file \hyperlink{LHK__sched_8c}{LHK\_\-sched.c}
\begin{CompactList}\small\item\em Implements scheduling for LAT housekeeping. \item\end{CompactList}

\end{CompactItemize}
