\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{structLCI__acdCompress}{LCI\_\-acd\-Compress} (Private structure holding the compression information for the ACD )}{\pageref{structLCI__acdCompress}}{}
\item\contentsline{section}{\hyperlink{structLCI__acdInput}{LCI\_\-acd\-Input} (The bounds for the various configurable calorimeter parameters )}{\pageref{structLCI__acdInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__acdValues}{LCI\_\-acd\-Values} (The ACD register values to be used for the next calibration cycle )}{\pageref{structLCI__acdValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__calCompress}{LCI\_\-cal\-Compress} (Private structure holding the compression information for the calorimeter )}{\pageref{structLCI__calCompress}}{}
\item\contentsline{section}{\hyperlink{structLCI__calInput}{LCI\_\-cal\-Input} (The bounds for the various configurable calorimeter parameters )}{\pageref{structLCI__calInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__calValues}{LCI\_\-cal\-Values} (The CAL register values to be used for the next calibration cycle )}{\pageref{structLCI__calValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfInput}{LCI\_\-cnf\-Input} (The configuration parameters stored in binary file )}{\pageref{structLCI__cnfInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} (Specification for an iterating LCI configuration value )}{\pageref{structLCI__cnfItem}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfValues}{LCI\_\-cnf\-Values} (The registers values to used for the next calibration cycle )}{\pageref{structLCI__cnfValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__collection__}{LCI\_\-collection\_\-} (The state of the event collection for this calibration cycle comprising various communication pointers, the synchornisation structure, the number of outstanding events, and temporary storage for the raw events )}{\pageref{structLCI__collection__}}{}
\item\contentsline{section}{\hyperlink{structLCI__compaction__}{LCI\_\-compaction\_\-} (Aggregation of the private compession structures along with the aritmetic probability encoder context )}{\pageref{structLCI__compaction__}}{}
\item\contentsline{section}{\hyperlink{structLCI__compression__}{LCI\_\-compression\_\-} (Structure, derived from the conversation structure, holding a histogram of the raw data and the frequency tables derived from it )}{\pageref{structLCI__compression__}}{}
\item\contentsline{section}{\hyperlink{structLCI__configuration__}{LCI\_\-configuration\_\-} (Holds the cycle configuration data along with a pointer to the file holding the configurations for all the cycles of this calibration )}{\pageref{structLCI__configuration__}}{}
\item\contentsline{section}{\hyperlink{structLCI__cue__}{LCI\_\-cue\_\-} (Structure holding wake-up timer, semaphore and termination state )}{\pageref{structLCI__cue__}}{}
\item\contentsline{section}{\hyperlink{structLCI__gemCompress}{LCI\_\-gem\-Compress} (Private structure holding the compression information for the GEM )}{\pageref{structLCI__gemCompress}}{}
\item\contentsline{section}{\hyperlink{structLCI__gemInput}{LCI\_\-gem\-Input} (The GEM configuration parameters stored in binary file )}{\pageref{structLCI__gemInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrCompress}{LCI\_\-tkr\-Compress} (Private structure holding the compression information for the tracker )}{\pageref{structLCI__tkrCompress}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrInput}{LCI\_\-tkr\-Input} (The bounds for the various configurable tracker parameters )}{\pageref{structLCI__tkrInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrValues}{LCI\_\-tkr\-Values} (The TKR register values to be used for the next calibration cycle )}{\pageref{structLCI__tkrValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__version}{LCI\_\-version} (Configuration type and version information )}{\pageref{structLCI__version}}{}
\end{CompactList}
