\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__LCI__configuration}{\_\-LCI\_\-configuration} (Holds the cycle configuration data along with a pointer to the file holding the configurations for all the cycles of this calibration )}{\pageref{struct__LCI__configuration}}{}
\item\contentsline{section}{\hyperlink{structLCI__acdInput}{LCI\_\-acd\-Input} (The configurable ACD parameters stored in a binary file )}{\pageref{structLCI__acdInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__acdValues}{LCI\_\-acd\-Values} (The ACD register values to be used for the next calibration cycle )}{\pageref{structLCI__acdValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__calInput}{LCI\_\-cal\-Input} (The configurable calorimeter parameters stored in a binary file )}{\pageref{structLCI__calInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__calValues}{LCI\_\-cal\-Values} (The CAL register values to be used for the next calibration cycle )}{\pageref{structLCI__calValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfInput}{LCI\_\-cnf\-Input} (The configuration parameters stored in binary file )}{\pageref{structLCI__cnfInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} (Specification for an iterating LCI configuration value )}{\pageref{structLCI__cnfItem}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfValues}{LCI\_\-cnf\-Values} (The registers values to used for the next calibration cycle )}{\pageref{structLCI__cnfValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__gemInput}{LCI\_\-gem\-Input} (The GEM configuration parameters stored in binary file )}{\pageref{structLCI__gemInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrInput}{LCI\_\-tkr\-Input} (The configurable tracker parameters stored in a binary file )}{\pageref{structLCI__tkrInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrValues}{LCI\_\-tkr\-Values} (The TKR register values to be used for the next calibration cycle )}{\pageref{structLCI__tkrValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__version}{LCI\_\-version} (Configuration type and version information )}{\pageref{structLCI__version}}{}
\end{CompactList}
