\hypertarget{structLCI__version}{
\section{LCI\_\-version Struct Reference}
\label{structLCI__version}\index{LCI_version@{LCI\_\-version}}
}
Configuration type and version information.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__version_o0}{
unsigned \hyperlink{structLCI__version_o0}{maj}:10}
\label{structLCI__version_o0}

\begin{CompactList}\small\item\em Major version number. \item\end{CompactList}\item 
\hypertarget{structLCI__version_o1}{
unsigned \hyperlink{structLCI__version_o1}{min}:10}
\label{structLCI__version_o1}

\begin{CompactList}\small\item\em Minor version number. \item\end{CompactList}\item 
\hypertarget{structLCI__version_o2}{
unsigned \hyperlink{structLCI__version_o2}{\_\-\_\-pad0\_\-\_\-}:10}
\label{structLCI__version_o2}

\begin{CompactList}\small\item\em Reserved. \item\end{CompactList}\item 
\hypertarget{structLCI__version_o3}{
unsigned \hyperlink{structLCI__version_o3}{mode}: 2}
\label{structLCI__version_o3}

\begin{CompactList}\small\item\em Type (one of ACD, CAL or TKR). \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Configuration type and version information. 

\begin{Desc}
\item[Warning:]This structure is written to and read from the filesystem so do not add elements that are are for internal use only\end{Desc}




The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
