\hypertarget{structLCI__tkrValues}{
\section{LCI\_\-tkr\-Values Struct Reference}
\label{structLCI__tkrValues}\index{LCI_tkrValues@{LCI\_\-tkrValues}}
}
The TKR register values to be used for the next calibration cycle.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__tkrValues_o0}{
unsigned short \hyperlink{structLCI__tkrValues_o0}{inj}}
\label{structLCI__tkrValues_o0}

\begin{CompactList}\small\item\em Injection. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_o1}{
unsigned short \hyperlink{structLCI__tkrValues_o1}{thr}}
\label{structLCI__tkrValues_o1}

\begin{CompactList}\small\item\em Threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_o2}{
unsigned short \hyperlink{structLCI__tkrValues_o2}{chnl}}
\label{structLCI__tkrValues_o2}

\begin{CompactList}\small\item\em Channel number. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_o3}{
unsigned short \hyperlink{structLCI__tkrValues_o3}{tack}}
\label{structLCI__tkrValues_o3}

\begin{CompactList}\small\item\em Trigger squence TACK. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_o4}{
unsigned short \hyperlink{structLCI__tkrValues_o4}{split\-Hi}}
\label{structLCI__tkrValues_o4}

\begin{CompactList}\small\item\em High end split. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_o5}{
unsigned short \hyperlink{structLCI__tkrValues_o5}{split\-Lo}}
\label{structLCI__tkrValues_o5}

\begin{CompactList}\small\item\em Low end split. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The TKR register values to be used for the next calibration cycle. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
