\hypertarget{structLCI__tkrInput}{
\section{LCI\_\-tkr\-Input Struct Reference}
\label{structLCI__tkrInput}\index{LCI_tkrInput@{LCI\_\-tkrInput}}
}
The configurable tracker parameters stored in a binary file.  


{\tt \#include $<$configure\_\-p.h$>$}

Collaboration diagram for LCI\_\-tkr\-Input:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=57pt]{structLCI__tkrInput__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__tkrInput_o0}{
unsigned \hyperlink{structLCI__tkrInput_o0}{split\-Lo}}
\label{structLCI__tkrInput_o0}

\begin{CompactList}\small\item\em Low end split. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_o1}{
unsigned \hyperlink{structLCI__tkrInput_o1}{split\-Hi}}
\label{structLCI__tkrInput_o1}

\begin{CompactList}\small\item\em High end split. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_o2}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__tkrInput_o2}{inj}}
\label{structLCI__tkrInput_o2}

\begin{CompactList}\small\item\em Injection DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_o3}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__tkrInput_o3}{thr}}
\label{structLCI__tkrInput_o3}

\begin{CompactList}\small\item\em Threshold DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_o4}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__tkrInput_o4}{chnl}}
\label{structLCI__tkrInput_o4}

\begin{CompactList}\small\item\em Channels to enable. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_o5}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__tkrInput_o5}{tack}}
\label{structLCI__tkrInput_o5}

\begin{CompactList}\small\item\em TACK delay. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The configurable tracker parameters stored in a binary file. 

\begin{Desc}
\item[Warning:]This structure is written to and read from the filesystem so do not add elements that are are for internal use only\end{Desc}




The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
