\hypertarget{structLCI__cnfValues}{
\section{LCI\_\-cnf\-Values Struct Reference}
\label{structLCI__cnfValues}\index{LCI_cnfValues@{LCI\_\-cnfValues}}
}
The registers values to used for the next calibration cycle.  


{\tt \#include $<$configure\_\-p.h$>$}

Collaboration diagram for LCI\_\-cnf\-Values:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=162pt]{structLCI__cnfValues__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__cnfValues_o0}{
\hyperlink{structLCI__acdValues}{LCI\_\-acd\-Values} \hyperlink{structLCI__cnfValues_o0}{acd}}
\label{structLCI__cnfValues_o0}

\begin{CompactList}\small\item\em ACD registers. \item\end{CompactList}\item 
\hypertarget{structLCI__cnfValues_o1}{
\hyperlink{structLCI__calValues}{LCI\_\-cal\-Values} \hyperlink{structLCI__cnfValues_o1}{cal}}
\label{structLCI__cnfValues_o1}

\begin{CompactList}\small\item\em CAL registers. \item\end{CompactList}\item 
\hypertarget{structLCI__cnfValues_o2}{
\hyperlink{structLCI__tkrValues}{LCI\_\-tkr\-Values} \hyperlink{structLCI__cnfValues_o2}{tkr}}
\label{structLCI__cnfValues_o2}

\begin{CompactList}\small\item\em TKR registers. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The registers values to used for the next calibration cycle. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
