\hypertarget{structLCI__acdInput}{
\section{LCI\_\-acd\-Input Struct Reference}
\label{structLCI__acdInput}\index{LCI_acdInput@{LCI\_\-acdInput}}
}
The configurable ACD parameters stored in a binary file.  


{\tt \#include $<$configure\_\-p.h$>$}

Collaboration diagram for LCI\_\-acd\-Input:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=58pt]{structLCI__acdInput__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__acdInput_o0}{
unsigned \hyperlink{structLCI__acdInput_o0}{range}}
\label{structLCI__acdInput_o0}

\begin{CompactList}\small\item\em Range bit. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o1}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o1}{inj}}
\label{structLCI__acdInput_o1}

\begin{CompactList}\small\item\em Injection DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o2}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o2}{hld}}
\label{structLCI__acdInput_o2}

\begin{CompactList}\small\item\em High Level Discriminator DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o3}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o3}{vern}}
\label{structLCI__acdInput_o3}

\begin{CompactList}\small\item\em Veto vernier. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o4}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o4}{veto}}
\label{structLCI__acdInput_o4}

\begin{CompactList}\small\item\em Veto threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o5}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o5}{pha}}
\label{structLCI__acdInput_o5}

\begin{CompactList}\small\item\em PHA threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o6}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o6}{bias}}
\label{structLCI__acdInput_o6}

\begin{CompactList}\small\item\em Bias DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o7}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o7}{hold}}
\label{structLCI__acdInput_o7}

\begin{CompactList}\small\item\em Hold delay. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o8}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o8}{hitm}}
\label{structLCI__acdInput_o8}

\begin{CompactList}\small\item\em Hitmap delay. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_o9}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnf\-Item} \hyperlink{structLCI__acdInput_o9}{chnl}}
\label{structLCI__acdInput_o9}

\begin{CompactList}\small\item\em Channel to enable. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The configurable ACD parameters stored in a binary file. 

\begin{Desc}
\item[Warning:]This structure is written to and read from the filesystem so do not add elements that are are for internal use only\end{Desc}




The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
