\section{LCI\_\-tkrInput Struct Reference}
\label{structLCI__tkrInput}\index{LCI\_\-tkrInput@{LCI\_\-tkrInput}}


The configurable tracker parameters stored in a binary file.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned \hyperlink{structLCI__tkrInput_a3685a990498cf0ab685de10777c161b8}{splitLo}\label{structLCI__tkrInput_a3685a990498cf0ab685de10777c161b8}

\begin{DoxyCompactList}\small\item\em Low end split. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__tkrInput_a73cc5f4bb89a77610d1f9027661736ca}{splitHi}\label{structLCI__tkrInput_a73cc5f4bb89a77610d1f9027661736ca}

\begin{DoxyCompactList}\small\item\em High end split. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_affbc6bf134b56388989be05e5866f7ed}{inj}\label{structLCI__tkrInput_affbc6bf134b56388989be05e5866f7ed}

\begin{DoxyCompactList}\small\item\em Injection DAC. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_a1a3e4949f6d56d87d4f3db831d8f0d38}{thr}\label{structLCI__tkrInput_a1a3e4949f6d56d87d4f3db831d8f0d38}

\begin{DoxyCompactList}\small\item\em Threshold DAC. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_a0ee3bd28f9f254b4cf654e6f4965e905}{chnl}\label{structLCI__tkrInput_a0ee3bd28f9f254b4cf654e6f4965e905}

\begin{DoxyCompactList}\small\item\em Channels to enable. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_a2a2aac5ff20b4c1d13b4e51db7178cc2}{tack}\label{structLCI__tkrInput_a2a2aac5ff20b4c1d13b4e51db7178cc2}

\begin{DoxyCompactList}\small\item\em TACK delay. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
The configurable tracker parameters stored in a binary file. 

\begin{DoxyWarning}{Warning}
This structure is written to and read from the filesystem so do not add elements that are are for internal use only 
\end{DoxyWarning}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
