\section{LCI\_\-acdInput Struct Reference}
\label{structLCI__acdInput}\index{LCI\_\-acdInput@{LCI\_\-acdInput}}


The configurable ACD parameters stored in a binary file.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned \hyperlink{structLCI__acdInput_a755c2d3804a7acd6793ab0805a7365a7}{range}\label{structLCI__acdInput_a755c2d3804a7acd6793ab0805a7365a7}

\begin{DoxyCompactList}\small\item\em Range bit. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_afd95c6cf2bb1c464ae84ba9a758a2722}{inj}\label{structLCI__acdInput_afd95c6cf2bb1c464ae84ba9a758a2722}

\begin{DoxyCompactList}\small\item\em Injection DAC. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_afead6dc9bb05b18f6d6cadec60b8b94f}{hld}\label{structLCI__acdInput_afead6dc9bb05b18f6d6cadec60b8b94f}

\begin{DoxyCompactList}\small\item\em High Level Discriminator DAC. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_a9f7978df64dd2cd5ea9fdc4a960e15f6}{vern}\label{structLCI__acdInput_a9f7978df64dd2cd5ea9fdc4a960e15f6}

\begin{DoxyCompactList}\small\item\em Veto vernier. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_a1cb705e06c20a13a9e669234a0d4ba1d}{veto}\label{structLCI__acdInput_a1cb705e06c20a13a9e669234a0d4ba1d}

\begin{DoxyCompactList}\small\item\em Veto threshold. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_ad4f3fd28a1fd24c3acc43c9a7cac2a5f}{pha}\label{structLCI__acdInput_ad4f3fd28a1fd24c3acc43c9a7cac2a5f}

\begin{DoxyCompactList}\small\item\em PHA threshold. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_a6dd0a34a0cd3b72af41c6577a72967e9}{bias}\label{structLCI__acdInput_a6dd0a34a0cd3b72af41c6577a72967e9}

\begin{DoxyCompactList}\small\item\em Bias DAC. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_aca3736922e609ef733e84dcfe3f3630c}{hold}\label{structLCI__acdInput_aca3736922e609ef733e84dcfe3f3630c}

\begin{DoxyCompactList}\small\item\em Hold delay. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_a893dbb6c01a3cec0388ea813707a0fef}{hitm}\label{structLCI__acdInput_a893dbb6c01a3cec0388ea813707a0fef}

\begin{DoxyCompactList}\small\item\em Hitmap delay. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_af952baba22d6b16449b164c9de8f50cf}{chnl}\label{structLCI__acdInput_af952baba22d6b16449b164c9de8f50cf}

\begin{DoxyCompactList}\small\item\em Channel to enable. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
The configurable ACD parameters stored in a binary file. 

\begin{DoxyWarning}{Warning}
This structure is written to and read from the filesystem so do not add elements that are are for internal use only 
\end{DoxyWarning}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
