\section{LCI\_\-cnfItem Struct Reference}
\label{structLCI__cnfItem}\index{LCI\_\-cnfItem@{LCI\_\-cnfItem}}


Specification for an iterating LCI configuration value.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned short \hyperlink{structLCI__cnfItem_a5b6d01ee811a46923c08893ab053bb3b}{start}\label{structLCI__cnfItem_a5b6d01ee811a46923c08893ab053bb3b}

\begin{DoxyCompactList}\small\item\em Initial value. \end{DoxyCompactList}\item 
short \hyperlink{structLCI__cnfItem_a3898ef931bcee30107b0b4e5f6d30b39}{delta}\label{structLCI__cnfItem_a3898ef931bcee30107b0b4e5f6d30b39}

\begin{DoxyCompactList}\small\item\em Step size between values. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__cnfItem_a3839c2fdfc59bbae7d8109024160b904}{count}\label{structLCI__cnfItem_a3839c2fdfc59bbae7d8109024160b904}

\begin{DoxyCompactList}\small\item\em Number of iterations. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__cnfItem_aea8ab6382c11394c18c53d61c0b3604f}{curnt}\label{structLCI__cnfItem_aea8ab6382c11394c18c53d61c0b3604f}

\begin{DoxyCompactList}\small\item\em Current step. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Specification for an iterating LCI configuration value. 

The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
