\section{LCI\_\-calInput Struct Reference}
\label{structLCI__calInput}\index{LCI\_\-calInput@{LCI\_\-calInput}}


The configurable calorimeter parameters stored in a binary file.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned \hyperlink{structLCI__calInput_a4e73751f968ade9d7b934a30984bbcac}{firstRng}\label{structLCI__calInput_a4e73751f968ade9d7b934a30984bbcac}

\begin{DoxyCompactList}\small\item\em First range value and use bits. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_a7d71027598db189b621506b0f862a3a9}{gainLe}\label{structLCI__calInput_a7d71027598db189b621506b0f862a3a9}

\begin{DoxyCompactList}\small\item\em Low energy gain. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_ae507497b59ba2226d4f0c1282eeafe88}{gainHe}\label{structLCI__calInput_ae507497b59ba2226d4f0c1282eeafe88}

\begin{DoxyCompactList}\small\item\em High energy gain. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_ae5b3eb89dd98d20d915959f5014cca2e}{rngEnabLe}\label{structLCI__calInput_ae5b3eb89dd98d20d915959f5014cca2e}

\begin{DoxyCompactList}\small\item\em Low energy range enable bit. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_a294bd3a5cf2e3ba804f25f2e5ea91f85}{rngEnabHe}\label{structLCI__calInput_a294bd3a5cf2e3ba804f25f2e5ea91f85}

\begin{DoxyCompactList}\small\item\em High energy range enable bit. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_a843567d7e630a4f1243013e2935cb00c}{trgEnabLe}\label{structLCI__calInput_a843567d7e630a4f1243013e2935cb00c}

\begin{DoxyCompactList}\small\item\em Low energy trigger enable bit. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_a09ffcf43736d9fa332227fc97e5b9f57}{trgEnabHe}\label{structLCI__calInput_a09ffcf43736d9fa332227fc97e5b9f57}

\begin{DoxyCompactList}\small\item\em High energy trigger enable bit. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_aca4ecf61625629f644f5d1a7ecf1d710}{calEnabLe}\label{structLCI__calInput_aca4ecf61625629f644f5d1a7ecf1d710}

\begin{DoxyCompactList}\small\item\em Low energy calibration enable bit. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_ab3ebe96647719b34c59c7d92d8b0a99e}{calEnabHe}\label{structLCI__calInput_ab3ebe96647719b34c59c7d92d8b0a99e}

\begin{DoxyCompactList}\small\item\em High energy calibration enable bit. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__calInput_ac0e57ff4752e86605b35618cc50308f2}{calGain}\label{structLCI__calInput_ac0e57ff4752e86605b35618cc50308f2}

\begin{DoxyCompactList}\small\item\em Calibration gain bit. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_a5495ae3a4ac8594af2c804fe9233f85c}{inj}\label{structLCI__calInput_a5495ae3a4ac8594af2c804fe9233f85c}

\begin{DoxyCompactList}\small\item\em Injection DAC. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_a85349322a10db991a831a5f2eebd49e6}{uld}\label{structLCI__calInput_a85349322a10db991a831a5f2eebd49e6}

\begin{DoxyCompactList}\small\item\em Range Upper Level Discriminator threshold. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_a9861eefa785660d10d73031a4c6602e4}{acc}\label{structLCI__calInput_a9861eefa785660d10d73031a4c6602e4}

\begin{DoxyCompactList}\small\item\em Trigger Accept threshold. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_aff610396cf3f59263582d3b0d303056a}{le}\label{structLCI__calInput_aff610396cf3f59263582d3b0d303056a}

\begin{DoxyCompactList}\small\item\em Low Energy Trigger threshold. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_a841f56937f0c964b48a38423c13000af}{he}\label{structLCI__calInput_a841f56937f0c964b48a38423c13000af}

\begin{DoxyCompactList}\small\item\em High Energy Trigger threshold. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_ab2df8b1ec2cf66ceafacb1ade5dff523}{col}\label{structLCI__calInput_ab2df8b1ec2cf66ceafacb1ade5dff523}

\begin{DoxyCompactList}\small\item\em Columns to enable. \end{DoxyCompactList}\item 
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_a567d4a0c0adb655e0ecaf39889aa138e}{tack}\label{structLCI__calInput_a567d4a0c0adb655e0ecaf39889aa138e}

\begin{DoxyCompactList}\small\item\em TACK Delay. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
The configurable calorimeter parameters stored in a binary file. 

\begin{DoxyWarning}{Warning}
This structure is written to and read from the filesystem so do not add elements that are are for internal use only 
\end{DoxyWarning}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
