\section{LCI\_\-tkrValues Struct Reference}
\label{structLCI__tkrValues}\index{LCI\_\-tkrValues@{LCI\_\-tkrValues}}


The TKR register values to be used for the next calibration cycle.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned short \hyperlink{structLCI__tkrValues_a0b06cb53bac46555be4bb6bbc2442be8}{inj}\label{structLCI__tkrValues_a0b06cb53bac46555be4bb6bbc2442be8}

\begin{DoxyCompactList}\small\item\em Injection. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_af2076bb29add3ea3547d416258240510}{thr}\label{structLCI__tkrValues_af2076bb29add3ea3547d416258240510}

\begin{DoxyCompactList}\small\item\em Threshold. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_a9da9222db74ab16815b656db0f23de81}{chnl}\label{structLCI__tkrValues_a9da9222db74ab16815b656db0f23de81}

\begin{DoxyCompactList}\small\item\em Channel number. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_a14c5e2600584eb5e4f3442774da35444}{tack}\label{structLCI__tkrValues_a14c5e2600584eb5e4f3442774da35444}

\begin{DoxyCompactList}\small\item\em Trigger squence TACK. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_a061f5183b9e7e9fbcdf5cd218a3d23ff}{splitHi}\label{structLCI__tkrValues_a061f5183b9e7e9fbcdf5cd218a3d23ff}

\begin{DoxyCompactList}\small\item\em High end split. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_ae815d4f7512d9592ca82c6a16483e52b}{splitLo}\label{structLCI__tkrValues_ae815d4f7512d9592ca82c6a16483e52b}

\begin{DoxyCompactList}\small\item\em Low end split. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_a7acc1561ac982615328527b5b10913bf}{injPrev}\label{structLCI__tkrValues_a7acc1561ac982615328527b5b10913bf}

\begin{DoxyCompactList}\small\item\em Injection at previous configuration. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__tkrValues_a114ab77ac6e83d9cd5a7c27753a91bf9}{thrPrev}\label{structLCI__tkrValues_a114ab77ac6e83d9cd5a7c27753a91bf9}

\begin{DoxyCompactList}\small\item\em Threshold at previous configuration. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
The TKR register values to be used for the next calibration cycle. 

The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
