\section{Class List}
Here are the classes, structs, unions and interfaces with brief descriptions:\begin{DoxyCompactList}
\item\contentsline{section}{\hyperlink{struct__LCI__configuration}{\_\-LCI\_\-configuration} (Holds the cycle configuration data along with a pointer to the file holding the configurations for all the cycles of this calibration )}{\pageref{struct__LCI__configuration}}{}
\item\contentsline{section}{\hyperlink{struct__LCI__runInfo}{\_\-LCI\_\-runInfo} (Structure to hold information about the last LCI run Must match the layout of LHK telemetry )}{\pageref{struct__LCI__runInfo}}{}
\item\contentsline{section}{\hyperlink{structLCI__acdInput}{LCI\_\-acdInput} (The configurable ACD parameters stored in a binary file )}{\pageref{structLCI__acdInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__acdValues}{LCI\_\-acdValues} (The ACD register values to be used for the next calibration cycle )}{\pageref{structLCI__acdValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__calInput}{LCI\_\-calInput} (The configurable calorimeter parameters stored in a binary file )}{\pageref{structLCI__calInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__calValues}{LCI\_\-calValues} (The CAL register values to be used for the next calibration cycle )}{\pageref{structLCI__calValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfInput}{LCI\_\-cnfInput} (The configuration parameters stored in binary file )}{\pageref{structLCI__cnfInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} (Specification for an iterating LCI configuration value )}{\pageref{structLCI__cnfItem}}{}
\item\contentsline{section}{\hyperlink{structLCI__cnfValues}{LCI\_\-cnfValues} (The registers values to used for the next calibration cycle )}{\pageref{structLCI__cnfValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__gemInput}{LCI\_\-gemInput} (The GEM configuration parameters stored in binary file )}{\pageref{structLCI__gemInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrInput}{LCI\_\-tkrInput} (The configurable tracker parameters stored in a binary file )}{\pageref{structLCI__tkrInput}}{}
\item\contentsline{section}{\hyperlink{structLCI__tkrValues}{LCI\_\-tkrValues} (The TKR register values to be used for the next calibration cycle )}{\pageref{structLCI__tkrValues}}{}
\item\contentsline{section}{\hyperlink{structLCI__version}{LCI\_\-version} (Configuration type and version information )}{\pageref{structLCI__version}}{}
\item\contentsline{section}{\hyperlink{structTest}{Test} (Structure holding a pointer to a test function and the title of the test )}{\pageref{structTest}}{}
\end{DoxyCompactList}
