\section{LCI\_\-version Struct Reference}
\label{structLCI__version}\index{LCI\_\-version@{LCI\_\-version}}


Configuration type and version information.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned \hyperlink{structLCI__version_a570c7b89b02af4accc4748afb6ce3773}{maj}:10\label{structLCI__version_a570c7b89b02af4accc4748afb6ce3773}

\begin{DoxyCompactList}\small\item\em Major version number. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__version_aaf2dda6005f96589961c106ad82cbaf9}{min}:10\label{structLCI__version_aaf2dda6005f96589961c106ad82cbaf9}

\begin{DoxyCompactList}\small\item\em Minor version number. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__version_adc0b3e4a678d98f8e2651dfff701fb2f}{\_\-\_\-pad0\_\-\_\-}:10\label{structLCI__version_adc0b3e4a678d98f8e2651dfff701fb2f}

\begin{DoxyCompactList}\small\item\em Reserved. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__version_ae44a1308c54f45a77455e90e2dee66e8}{mode}: 2\label{structLCI__version_ae44a1308c54f45a77455e90e2dee66e8}

\begin{DoxyCompactList}\small\item\em Type (one of ACD, CAL or TKR). \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Configuration type and version information. 

\begin{DoxyWarning}{Warning}
This structure is written to and read from the filesystem so do not add elements that are are for internal use only 
\end{DoxyWarning}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
