\section{LCI\_\-gemInput Struct Reference}
\label{structLCI__gemInput}\index{LCI\_\-gemInput@{LCI\_\-gemInput}}


The GEM configuration parameters stored in binary file.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned \hyperlink{structLCI__gemInput_a8a4ca68023f712a8f2ce999b642b45b3}{nev}\label{structLCI__gemInput_a8a4ca68023f712a8f2ce999b642b45b3}

\begin{DoxyCompactList}\small\item\em Number of events to collect for each cycle performed using this configuration. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a72a1edbc7f3b21eafa8ce7b01f427628}{latcDelay}\label{structLCI__gemInput_a72a1edbc7f3b21eafa8ce7b01f427628}

\begin{DoxyCompactList}\small\item\em Delay after changing the LATC configuration to allow for settling. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a992a7161e3b27d17036b1a25423560fd}{delay}\label{structLCI__gemInput_a992a7161e3b27d17036b1a25423560fd}

\begin{DoxyCompactList}\small\item\em Delay after changing the inj DAC settings to allow for settling. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a250df4915ac0d025c220fc712e3898e3}{\_\-\_\-pad0\_\-\_\-}: 5\label{structLCI__gemInput_a250df4915ac0d025c220fc712e3898e3}

\begin{DoxyCompactList}\small\item\em Padding. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a212c0c8c9a84da0ee13c0e42718b11a6}{one\_\-range}: 1\label{structLCI__gemInput_a212c0c8c9a84da0ee13c0e42718b11a6}

\begin{DoxyCompactList}\small\item\em Use single-\/range readout, not 4-\/range. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a31bb5247d60a827bd15e41863a363fcb}{zero\_\-suppress}: 1\label{structLCI__gemInput_a31bb5247d60a827bd15e41863a363fcb}

\begin{DoxyCompactList}\small\item\em Zero suppress. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a060d507fedec9a05860843821a807cd9}{strobe}: 1\label{structLCI__gemInput_a060d507fedec9a05860843821a807cd9}

\begin{DoxyCompactList}\small\item\em Send the CALSTROBE. \end{DoxyCompactList}\item 
unsigned \hyperlink{structLCI__gemInput_a906ae575a65d5c673e07a65236f4f1ac}{period}:24\label{structLCI__gemInput_a906ae575a65d5c673e07a65236f4f1ac}

\begin{DoxyCompactList}\small\item\em Number of clock-\/ticks between events -\/ reqd to be $>$= 20000 (for a 1khz max rate) \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
The GEM configuration parameters stored in binary file. 

\begin{DoxyWarning}{Warning}
This structure is written to and read from the filesystem so do not add elements that are are for internal use only 
\end{DoxyWarning}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
