\section{LCI\_\-acdValues Struct Reference}
\label{structLCI__acdValues}\index{LCI\_\-acdValues@{LCI\_\-acdValues}}


The ACD register values to be used for the next calibration cycle.  




{\ttfamily \#include \char`\"{}configure\_\-p.h\char`\"{}}

\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned short \hyperlink{structLCI__acdValues_a7420f770177c00011ea875ff10bfa2aa}{inj}\label{structLCI__acdValues_a7420f770177c00011ea875ff10bfa2aa}

\begin{DoxyCompactList}\small\item\em Charge injection magnitude. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_ae0ee3d4917890b1712727a2b6d210050}{hld}\label{structLCI__acdValues_ae0ee3d4917890b1712727a2b6d210050}

\begin{DoxyCompactList}\small\item\em High level discriminator. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_a27c62cce0da4669c782fba6f8ad64586}{vern}\label{structLCI__acdValues_a27c62cce0da4669c782fba6f8ad64586}

\begin{DoxyCompactList}\small\item\em Veto Vernier. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_ae3d08bb0110aecbbd2f36cdcc53dfaea}{veto}\label{structLCI__acdValues_ae3d08bb0110aecbbd2f36cdcc53dfaea}

\begin{DoxyCompactList}\small\item\em Veto threshold. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_ac48a8d53cadf19d2004a965465869dba}{pha}\label{structLCI__acdValues_ac48a8d53cadf19d2004a965465869dba}

\begin{DoxyCompactList}\small\item\em PHA threshold. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_a76ec5891bd550644611838ef5b34524e}{bias}\label{structLCI__acdValues_a76ec5891bd550644611838ef5b34524e}

\begin{DoxyCompactList}\small\item\em Bias DAC. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_a137691d3349b9aaf258047765cfd8000}{hold}\label{structLCI__acdValues_a137691d3349b9aaf258047765cfd8000}

\begin{DoxyCompactList}\small\item\em Hold delay. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_a70f711c5b74b251a611a943d238baffc}{hitm}\label{structLCI__acdValues_a70f711c5b74b251a611a943d238baffc}

\begin{DoxyCompactList}\small\item\em Hitmap delay. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_a47d77fea64dbb8ad3e5c8d8cc324bdcf}{chnl}\label{structLCI__acdValues_a47d77fea64dbb8ad3e5c8d8cc324bdcf}

\begin{DoxyCompactList}\small\item\em Channel to enable. \end{DoxyCompactList}\item 
unsigned short \hyperlink{structLCI__acdValues_aaefc08102853b79fd11b5689fda73358}{range}\label{structLCI__acdValues_aaefc08102853b79fd11b5689fda73358}

\begin{DoxyCompactList}\small\item\em Range bit. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
The ACD register values to be used for the next calibration cycle. 

The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{DoxyCompactItemize}
