\hypertarget{structLCI__cnfValues}{
\section{LCI\_\-cnfValues Struct Reference}
\label{structLCI__cnfValues}\index{LCI\_\-cnfValues@{LCI\_\-cnfValues}}
}
The registers values to used for the next calibration cycle.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__cnfValues_e0aebd1aefb6bb3c81401cacd43938a5}{
\hyperlink{structLCI__acdValues}{LCI\_\-acdValues} \hyperlink{structLCI__cnfValues_e0aebd1aefb6bb3c81401cacd43938a5}{acd}}
\label{structLCI__cnfValues_e0aebd1aefb6bb3c81401cacd43938a5}

\begin{CompactList}\small\item\em ACD registers. \item\end{CompactList}\item 
\hypertarget{structLCI__cnfValues_84b8a3cae28cecd333e3ce18525cfd46}{
\hyperlink{structLCI__calValues}{LCI\_\-calValues} \hyperlink{structLCI__cnfValues_84b8a3cae28cecd333e3ce18525cfd46}{cal}}
\label{structLCI__cnfValues_84b8a3cae28cecd333e3ce18525cfd46}

\begin{CompactList}\small\item\em CAL registers. \item\end{CompactList}\item 
\hypertarget{structLCI__cnfValues_6b9885d4d4a0ca959d3d290ddc38b33c}{
\hyperlink{structLCI__tkrValues}{LCI\_\-tkrValues} \hyperlink{structLCI__cnfValues_6b9885d4d4a0ca959d3d290ddc38b33c}{tkr}}
\label{structLCI__cnfValues_6b9885d4d4a0ca959d3d290ddc38b33c}

\begin{CompactList}\small\item\em TKR registers. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The registers values to used for the next calibration cycle. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
