\hypertarget{structLCI__calValues}{
\section{LCI\_\-calValues Struct Reference}
\label{structLCI__calValues}\index{LCI\_\-calValues@{LCI\_\-calValues}}
}
The CAL register values to be used for the next calibration cycle.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__calValues_34e4872c557b265d746adf89336a7eb6}{
unsigned short \hyperlink{structLCI__calValues_34e4872c557b265d746adf89336a7eb6}{inj}}
\label{structLCI__calValues_34e4872c557b265d746adf89336a7eb6}

\begin{CompactList}\small\item\em Size of the injection. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_3f9c6a6d2bec737009f90b13536b01ee}{
unsigned short \hyperlink{structLCI__calValues_3f9c6a6d2bec737009f90b13536b01ee}{uld}}
\label{structLCI__calValues_3f9c6a6d2bec737009f90b13536b01ee}

\begin{CompactList}\small\item\em Upper level discriminator threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_2af7303e783a22e693f8c5c83b8e158a}{
unsigned short \hyperlink{structLCI__calValues_2af7303e783a22e693f8c5c83b8e158a}{acc}}
\label{structLCI__calValues_2af7303e783a22e693f8c5c83b8e158a}

\begin{CompactList}\small\item\em Accept threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_74f726f23c5d0961dde1c90fa79d01a3}{
unsigned short \hyperlink{structLCI__calValues_74f726f23c5d0961dde1c90fa79d01a3}{le}}
\label{structLCI__calValues_74f726f23c5d0961dde1c90fa79d01a3}

\begin{CompactList}\small\item\em Low Energy trigger threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_424c9461c596ae2cd48a009c9166a2f3}{
unsigned short \hyperlink{structLCI__calValues_424c9461c596ae2cd48a009c9166a2f3}{he}}
\label{structLCI__calValues_424c9461c596ae2cd48a009c9166a2f3}

\begin{CompactList}\small\item\em High Energy trigger threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_b413ccf2348aeb47f30c3ee2981e97f0}{
unsigned short \hyperlink{structLCI__calValues_b413ccf2348aeb47f30c3ee2981e97f0}{col}}
\label{structLCI__calValues_b413ccf2348aeb47f30c3ee2981e97f0}

\begin{CompactList}\small\item\em Column ID to enable. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_93d596966d6186a66a3d728a748a31b2}{
unsigned short \hyperlink{structLCI__calValues_93d596966d6186a66a3d728a748a31b2}{tack}}
\label{structLCI__calValues_93d596966d6186a66a3d728a748a31b2}

\begin{CompactList}\small\item\em Trigger sequence TACK. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_8f3318c124c1c0124a80cb4573345731}{
unsigned short \hyperlink{structLCI__calValues_8f3318c124c1c0124a80cb4573345731}{frst}}
\label{structLCI__calValues_8f3318c124c1c0124a80cb4573345731}

\begin{CompactList}\small\item\em Use first range settings. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_08a3038b982fd0f3e804e357c2057414}{
unsigned short \hyperlink{structLCI__calValues_08a3038b982fd0f3e804e357c2057414}{gainLe}}
\label{structLCI__calValues_08a3038b982fd0f3e804e357c2057414}

\begin{CompactList}\small\item\em Low energy gain. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_8b1129e54f7a44e04a4006beb81fd4a8}{
unsigned short \hyperlink{structLCI__calValues_8b1129e54f7a44e04a4006beb81fd4a8}{gainHe}}
\label{structLCI__calValues_8b1129e54f7a44e04a4006beb81fd4a8}

\begin{CompactList}\small\item\em High energy gain. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_cbae0ac0b176b3e826701ac0a5478446}{
unsigned short \hyperlink{structLCI__calValues_cbae0ac0b176b3e826701ac0a5478446}{rngEnabLe}}
\label{structLCI__calValues_cbae0ac0b176b3e826701ac0a5478446}

\begin{CompactList}\small\item\em Low energy range enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_d8cdc52c28810b5f1859971040e3f132}{
unsigned short \hyperlink{structLCI__calValues_d8cdc52c28810b5f1859971040e3f132}{rngEnabHe}}
\label{structLCI__calValues_d8cdc52c28810b5f1859971040e3f132}

\begin{CompactList}\small\item\em High energy range enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_ef37940e592ff21856625b7e5ab1e0f1}{
unsigned short \hyperlink{structLCI__calValues_ef37940e592ff21856625b7e5ab1e0f1}{trgEnabLe}}
\label{structLCI__calValues_ef37940e592ff21856625b7e5ab1e0f1}

\begin{CompactList}\small\item\em Low energy trigger enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_296ce69b2d12a5f121e8a91f623ac028}{
unsigned short \hyperlink{structLCI__calValues_296ce69b2d12a5f121e8a91f623ac028}{trgEnabHe}}
\label{structLCI__calValues_296ce69b2d12a5f121e8a91f623ac028}

\begin{CompactList}\small\item\em High energy trigger enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_7f1ad8ff28d37bb55cd981d7959484d5}{
unsigned short \hyperlink{structLCI__calValues_7f1ad8ff28d37bb55cd981d7959484d5}{calEnabLe}}
\label{structLCI__calValues_7f1ad8ff28d37bb55cd981d7959484d5}

\begin{CompactList}\small\item\em Low energy calibration enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_0ec968ee2952137e9b6a77c66bc39d9a}{
unsigned short \hyperlink{structLCI__calValues_0ec968ee2952137e9b6a77c66bc39d9a}{calEnabHe}}
\label{structLCI__calValues_0ec968ee2952137e9b6a77c66bc39d9a}

\begin{CompactList}\small\item\em High energy calibration enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calValues_33c9fc69286accfbe54203c9a2d54f6b}{
unsigned short \hyperlink{structLCI__calValues_33c9fc69286accfbe54203c9a2d54f6b}{calGain}}
\label{structLCI__calValues_33c9fc69286accfbe54203c9a2d54f6b}

\begin{CompactList}\small\item\em Calibration gain bit. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The CAL register values to be used for the next calibration cycle. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
