\hypertarget{structLCI__acdInput}{
\section{LCI\_\-acdInput Struct Reference}
\label{structLCI__acdInput}\index{LCI\_\-acdInput@{LCI\_\-acdInput}}
}
The configurable ACD parameters stored in a binary file.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__acdInput_755c2d3804a7acd6793ab0805a7365a7}{
unsigned \hyperlink{structLCI__acdInput_755c2d3804a7acd6793ab0805a7365a7}{range}}
\label{structLCI__acdInput_755c2d3804a7acd6793ab0805a7365a7}

\begin{CompactList}\small\item\em Range bit. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_fd95c6cf2bb1c464ae84ba9a758a2722}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_fd95c6cf2bb1c464ae84ba9a758a2722}{inj}}
\label{structLCI__acdInput_fd95c6cf2bb1c464ae84ba9a758a2722}

\begin{CompactList}\small\item\em Injection DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_fead6dc9bb05b18f6d6cadec60b8b94f}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_fead6dc9bb05b18f6d6cadec60b8b94f}{hld}}
\label{structLCI__acdInput_fead6dc9bb05b18f6d6cadec60b8b94f}

\begin{CompactList}\small\item\em High Level Discriminator DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_9f7978df64dd2cd5ea9fdc4a960e15f6}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_9f7978df64dd2cd5ea9fdc4a960e15f6}{vern}}
\label{structLCI__acdInput_9f7978df64dd2cd5ea9fdc4a960e15f6}

\begin{CompactList}\small\item\em Veto vernier. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_1cb705e06c20a13a9e669234a0d4ba1d}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_1cb705e06c20a13a9e669234a0d4ba1d}{veto}}
\label{structLCI__acdInput_1cb705e06c20a13a9e669234a0d4ba1d}

\begin{CompactList}\small\item\em Veto threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_d4f3fd28a1fd24c3acc43c9a7cac2a5f}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_d4f3fd28a1fd24c3acc43c9a7cac2a5f}{pha}}
\label{structLCI__acdInput_d4f3fd28a1fd24c3acc43c9a7cac2a5f}

\begin{CompactList}\small\item\em PHA threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_6dd0a34a0cd3b72af41c6577a72967e9}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_6dd0a34a0cd3b72af41c6577a72967e9}{bias}}
\label{structLCI__acdInput_6dd0a34a0cd3b72af41c6577a72967e9}

\begin{CompactList}\small\item\em Bias DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_ca3736922e609ef733e84dcfe3f3630c}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_ca3736922e609ef733e84dcfe3f3630c}{hold}}
\label{structLCI__acdInput_ca3736922e609ef733e84dcfe3f3630c}

\begin{CompactList}\small\item\em Hold delay. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_893dbb6c01a3cec0388ea813707a0fef}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_893dbb6c01a3cec0388ea813707a0fef}{hitm}}
\label{structLCI__acdInput_893dbb6c01a3cec0388ea813707a0fef}

\begin{CompactList}\small\item\em Hitmap delay. \item\end{CompactList}\item 
\hypertarget{structLCI__acdInput_f952baba22d6b16449b164c9de8f50cf}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__acdInput_f952baba22d6b16449b164c9de8f50cf}{chnl}}
\label{structLCI__acdInput_f952baba22d6b16449b164c9de8f50cf}

\begin{CompactList}\small\item\em Channel to enable. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The configurable ACD parameters stored in a binary file. 

\begin{Desc}
\item[Warning:]This structure is written to and read from the filesystem so do not add elements that are are for internal use only \end{Desc}


The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
