\hypertarget{structLCI__tkrValues}{
\section{LCI\_\-tkrValues Struct Reference}
\label{structLCI__tkrValues}\index{LCI_tkrValues@{LCI\_\-tkrValues}}
}
The TKR register values to be used for the next calibration cycle.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__tkrValues_0b06cb53bac46555be4bb6bbc2442be8}{
unsigned short \hyperlink{structLCI__tkrValues_0b06cb53bac46555be4bb6bbc2442be8}{inj}}
\label{structLCI__tkrValues_0b06cb53bac46555be4bb6bbc2442be8}

\begin{CompactList}\small\item\em Injection. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_f2076bb29add3ea3547d416258240510}{
unsigned short \hyperlink{structLCI__tkrValues_f2076bb29add3ea3547d416258240510}{thr}}
\label{structLCI__tkrValues_f2076bb29add3ea3547d416258240510}

\begin{CompactList}\small\item\em Threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_9da9222db74ab16815b656db0f23de81}{
unsigned short \hyperlink{structLCI__tkrValues_9da9222db74ab16815b656db0f23de81}{chnl}}
\label{structLCI__tkrValues_9da9222db74ab16815b656db0f23de81}

\begin{CompactList}\small\item\em Channel number. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_14c5e2600584eb5e4f3442774da35444}{
unsigned short \hyperlink{structLCI__tkrValues_14c5e2600584eb5e4f3442774da35444}{tack}}
\label{structLCI__tkrValues_14c5e2600584eb5e4f3442774da35444}

\begin{CompactList}\small\item\em Trigger squence TACK. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_061f5183b9e7e9fbcdf5cd218a3d23ff}{
unsigned short \hyperlink{structLCI__tkrValues_061f5183b9e7e9fbcdf5cd218a3d23ff}{splitHi}}
\label{structLCI__tkrValues_061f5183b9e7e9fbcdf5cd218a3d23ff}

\begin{CompactList}\small\item\em High end split. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrValues_e815d4f7512d9592ca82c6a16483e52b}{
unsigned short \hyperlink{structLCI__tkrValues_e815d4f7512d9592ca82c6a16483e52b}{splitLo}}
\label{structLCI__tkrValues_e815d4f7512d9592ca82c6a16483e52b}

\begin{CompactList}\small\item\em Low end split. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The TKR register values to be used for the next calibration cycle. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
