\hypertarget{structLCI__tkrInput}{
\section{LCI\_\-tkrInput Struct Reference}
\label{structLCI__tkrInput}\index{LCI_tkrInput@{LCI\_\-tkrInput}}
}
The configurable tracker parameters stored in a binary file.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__tkrInput_3685a990498cf0ab685de10777c161b8}{
unsigned \hyperlink{structLCI__tkrInput_3685a990498cf0ab685de10777c161b8}{splitLo}}
\label{structLCI__tkrInput_3685a990498cf0ab685de10777c161b8}

\begin{CompactList}\small\item\em Low end split. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_73cc5f4bb89a77610d1f9027661736ca}{
unsigned \hyperlink{structLCI__tkrInput_73cc5f4bb89a77610d1f9027661736ca}{splitHi}}
\label{structLCI__tkrInput_73cc5f4bb89a77610d1f9027661736ca}

\begin{CompactList}\small\item\em High end split. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_ffbc6bf134b56388989be05e5866f7ed}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_ffbc6bf134b56388989be05e5866f7ed}{inj}}
\label{structLCI__tkrInput_ffbc6bf134b56388989be05e5866f7ed}

\begin{CompactList}\small\item\em Injection DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_1a3e4949f6d56d87d4f3db831d8f0d38}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_1a3e4949f6d56d87d4f3db831d8f0d38}{thr}}
\label{structLCI__tkrInput_1a3e4949f6d56d87d4f3db831d8f0d38}

\begin{CompactList}\small\item\em Threshold DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_0ee3bd28f9f254b4cf654e6f4965e905}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_0ee3bd28f9f254b4cf654e6f4965e905}{chnl}}
\label{structLCI__tkrInput_0ee3bd28f9f254b4cf654e6f4965e905}

\begin{CompactList}\small\item\em Channels to enable. \item\end{CompactList}\item 
\hypertarget{structLCI__tkrInput_2a2aac5ff20b4c1d13b4e51db7178cc2}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__tkrInput_2a2aac5ff20b4c1d13b4e51db7178cc2}{tack}}
\label{structLCI__tkrInput_2a2aac5ff20b4c1d13b4e51db7178cc2}

\begin{CompactList}\small\item\em TACK delay. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The configurable tracker parameters stored in a binary file. 

\begin{Desc}
\item[Warning:]This structure is written to and read from the filesystem so do not add elements that are are for internal use only \end{Desc}


The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
