\hypertarget{structLCI__calInput}{
\section{LCI\_\-calInput Struct Reference}
\label{structLCI__calInput}\index{LCI_calInput@{LCI\_\-calInput}}
}
The configurable calorimeter parameters stored in a binary file.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__calInput_4e73751f968ade9d7b934a30984bbcac}{
unsigned \hyperlink{structLCI__calInput_4e73751f968ade9d7b934a30984bbcac}{firstRng}}
\label{structLCI__calInput_4e73751f968ade9d7b934a30984bbcac}

\begin{CompactList}\small\item\em First range value and use bits. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_7d71027598db189b621506b0f862a3a9}{
unsigned \hyperlink{structLCI__calInput_7d71027598db189b621506b0f862a3a9}{gainLe}}
\label{structLCI__calInput_7d71027598db189b621506b0f862a3a9}

\begin{CompactList}\small\item\em Low energy gain. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_e507497b59ba2226d4f0c1282eeafe88}{
unsigned \hyperlink{structLCI__calInput_e507497b59ba2226d4f0c1282eeafe88}{gainHe}}
\label{structLCI__calInput_e507497b59ba2226d4f0c1282eeafe88}

\begin{CompactList}\small\item\em High energy gain. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_e5b3eb89dd98d20d915959f5014cca2e}{
unsigned \hyperlink{structLCI__calInput_e5b3eb89dd98d20d915959f5014cca2e}{rngEnabLe}}
\label{structLCI__calInput_e5b3eb89dd98d20d915959f5014cca2e}

\begin{CompactList}\small\item\em Low energy range enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_294bd3a5cf2e3ba804f25f2e5ea91f85}{
unsigned \hyperlink{structLCI__calInput_294bd3a5cf2e3ba804f25f2e5ea91f85}{rngEnabHe}}
\label{structLCI__calInput_294bd3a5cf2e3ba804f25f2e5ea91f85}

\begin{CompactList}\small\item\em High energy range enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_843567d7e630a4f1243013e2935cb00c}{
unsigned \hyperlink{structLCI__calInput_843567d7e630a4f1243013e2935cb00c}{trgEnabLe}}
\label{structLCI__calInput_843567d7e630a4f1243013e2935cb00c}

\begin{CompactList}\small\item\em Low energy trigger enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_09ffcf43736d9fa332227fc97e5b9f57}{
unsigned \hyperlink{structLCI__calInput_09ffcf43736d9fa332227fc97e5b9f57}{trgEnabHe}}
\label{structLCI__calInput_09ffcf43736d9fa332227fc97e5b9f57}

\begin{CompactList}\small\item\em High energy trigger enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_ca4ecf61625629f644f5d1a7ecf1d710}{
unsigned \hyperlink{structLCI__calInput_ca4ecf61625629f644f5d1a7ecf1d710}{calEnabLe}}
\label{structLCI__calInput_ca4ecf61625629f644f5d1a7ecf1d710}

\begin{CompactList}\small\item\em Low energy calibration enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_b3ebe96647719b34c59c7d92d8b0a99e}{
unsigned \hyperlink{structLCI__calInput_b3ebe96647719b34c59c7d92d8b0a99e}{calEnabHe}}
\label{structLCI__calInput_b3ebe96647719b34c59c7d92d8b0a99e}

\begin{CompactList}\small\item\em High energy calibration enable bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_c0e57ff4752e86605b35618cc50308f2}{
unsigned \hyperlink{structLCI__calInput_c0e57ff4752e86605b35618cc50308f2}{calGain}}
\label{structLCI__calInput_c0e57ff4752e86605b35618cc50308f2}

\begin{CompactList}\small\item\em Calibration gain bit. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_5495ae3a4ac8594af2c804fe9233f85c}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_5495ae3a4ac8594af2c804fe9233f85c}{inj}}
\label{structLCI__calInput_5495ae3a4ac8594af2c804fe9233f85c}

\begin{CompactList}\small\item\em Injection DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_85349322a10db991a831a5f2eebd49e6}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_85349322a10db991a831a5f2eebd49e6}{uld}}
\label{structLCI__calInput_85349322a10db991a831a5f2eebd49e6}

\begin{CompactList}\small\item\em Range Upper Level Discriminator threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_9861eefa785660d10d73031a4c6602e4}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_9861eefa785660d10d73031a4c6602e4}{acc}}
\label{structLCI__calInput_9861eefa785660d10d73031a4c6602e4}

\begin{CompactList}\small\item\em Trigger Accept threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_ff610396cf3f59263582d3b0d303056a}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_ff610396cf3f59263582d3b0d303056a}{le}}
\label{structLCI__calInput_ff610396cf3f59263582d3b0d303056a}

\begin{CompactList}\small\item\em Low Energy Trigger threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_841f56937f0c964b48a38423c13000af}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_841f56937f0c964b48a38423c13000af}{he}}
\label{structLCI__calInput_841f56937f0c964b48a38423c13000af}

\begin{CompactList}\small\item\em High Energy Trigger threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_b2df8b1ec2cf66ceafacb1ade5dff523}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_b2df8b1ec2cf66ceafacb1ade5dff523}{col}}
\label{structLCI__calInput_b2df8b1ec2cf66ceafacb1ade5dff523}

\begin{CompactList}\small\item\em Columns to enable. \item\end{CompactList}\item 
\hypertarget{structLCI__calInput_567d4a0c0adb655e0ecaf39889aa138e}{
\hyperlink{structLCI__cnfItem}{LCI\_\-cnfItem} \hyperlink{structLCI__calInput_567d4a0c0adb655e0ecaf39889aa138e}{tack}}
\label{structLCI__calInput_567d4a0c0adb655e0ecaf39889aa138e}

\begin{CompactList}\small\item\em TACK Delay. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The configurable calorimeter parameters stored in a binary file. 

\begin{Desc}
\item[Warning:]This structure is written to and read from the filesystem so do not add elements that are are for internal use only \end{Desc}


The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
