\hypertarget{structLCI__acdValues}{
\section{LCI\_\-acdValues Struct Reference}
\label{structLCI__acdValues}\index{LCI_acdValues@{LCI\_\-acdValues}}
}
The ACD register values to be used for the next calibration cycle.  


{\tt \#include $<$configure\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structLCI__acdValues_7420f770177c00011ea875ff10bfa2aa}{
unsigned short \hyperlink{structLCI__acdValues_7420f770177c00011ea875ff10bfa2aa}{inj}}
\label{structLCI__acdValues_7420f770177c00011ea875ff10bfa2aa}

\begin{CompactList}\small\item\em Charge injection magnitude. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_e0ee3d4917890b1712727a2b6d210050}{
unsigned short \hyperlink{structLCI__acdValues_e0ee3d4917890b1712727a2b6d210050}{hld}}
\label{structLCI__acdValues_e0ee3d4917890b1712727a2b6d210050}

\begin{CompactList}\small\item\em High level discriminator. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_27c62cce0da4669c782fba6f8ad64586}{
unsigned short \hyperlink{structLCI__acdValues_27c62cce0da4669c782fba6f8ad64586}{vern}}
\label{structLCI__acdValues_27c62cce0da4669c782fba6f8ad64586}

\begin{CompactList}\small\item\em Veto Vernier. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_e3d08bb0110aecbbd2f36cdcc53dfaea}{
unsigned short \hyperlink{structLCI__acdValues_e3d08bb0110aecbbd2f36cdcc53dfaea}{veto}}
\label{structLCI__acdValues_e3d08bb0110aecbbd2f36cdcc53dfaea}

\begin{CompactList}\small\item\em Veto threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_c48a8d53cadf19d2004a965465869dba}{
unsigned short \hyperlink{structLCI__acdValues_c48a8d53cadf19d2004a965465869dba}{pha}}
\label{structLCI__acdValues_c48a8d53cadf19d2004a965465869dba}

\begin{CompactList}\small\item\em PHA threshold. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_76ec5891bd550644611838ef5b34524e}{
unsigned short \hyperlink{structLCI__acdValues_76ec5891bd550644611838ef5b34524e}{bias}}
\label{structLCI__acdValues_76ec5891bd550644611838ef5b34524e}

\begin{CompactList}\small\item\em Bias DAC. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_137691d3349b9aaf258047765cfd8000}{
unsigned short \hyperlink{structLCI__acdValues_137691d3349b9aaf258047765cfd8000}{hold}}
\label{structLCI__acdValues_137691d3349b9aaf258047765cfd8000}

\begin{CompactList}\small\item\em Hold delay. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_70f711c5b74b251a611a943d238baffc}{
unsigned short \hyperlink{structLCI__acdValues_70f711c5b74b251a611a943d238baffc}{hitm}}
\label{structLCI__acdValues_70f711c5b74b251a611a943d238baffc}

\begin{CompactList}\small\item\em Hitmap delay. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_47d77fea64dbb8ad3e5c8d8cc324bdcf}{
unsigned short \hyperlink{structLCI__acdValues_47d77fea64dbb8ad3e5c8d8cc324bdcf}{chnl}}
\label{structLCI__acdValues_47d77fea64dbb8ad3e5c8d8cc324bdcf}

\begin{CompactList}\small\item\em Channel to enable. \item\end{CompactList}\item 
\hypertarget{structLCI__acdValues_aefc08102853b79fd11b5689fda73358}{
unsigned short \hyperlink{structLCI__acdValues_aefc08102853b79fd11b5689fda73358}{range}}
\label{structLCI__acdValues_aefc08102853b79fd11b5689fda73358}

\begin{CompactList}\small\item\em Range bit. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The ACD register values to be used for the next calibration cycle. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{configure__p_8h}{configure\_\-p.h}\end{CompactItemize}
